& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

England in command

AFP, St John's
Paul Collingwood became the second century-maker in the England first innings when he hit his eighth Test hundred against West Indies in the third Test here on Monday.
West Indies made an unsteady start to reach 55 for one, replying to England's total of 566 for nine declared when stumps were drawn on the second day at the Antigua Recreation Ground.
Collingwood made 113 and shared three half-century stands to beef up the England total after captain Andrew Strauss's 169. Kevin Pietersen scored 51, Stuart Broad made 44, Matt Prior got 39 and Graeme Swann was not out on 20.
England trail the series 0-1 following an innings and 23-run defeat in the opening Test at Kingston inside four days. The second match was abandoned due to a dangerous outfield at the Sir Vivian Richards Cricket Ground.
Jerome Taylor collected two wickets for 73 runs from 28 overs, Fidel Edwards snared two for 75 from 26 overs, and Ryan Hinds poached two for 86 from 22.2 overs.
England’s new-ball pair of James Anderson and Andrew Flintoff then found out what their opponents had learnt about the ARG pitch over the past two days.
Flintoff got a few balls to jump from a good length and startle Chris Gayle, but the West Indies captain and fellow left-handed opener Devon Smith had little about which to worry in between.
Steve Harmison replaced Anderson at the northern end
for the eighth over of the innings and things started to happen.
His second delivery — a no-ball — Gayle blindly hooked over deep fine leg for a six way out of the small ground nestled in the Antigua and Barbuda capital.
A few balls later, Harmison dug in short again, and Gayle swatted another no-ball, one bounce, into the mid-wicket boundary for the last of his five fours.
But next delivery, England and Harmison were celebrating, when Gayle, weight on the back foot, was caught at mid-off driving loosely.
Earlier, Collingwood helped England pile on the runs.
He struck 14 boundaries from 202 balls in just over five hours before he was dismissed -- caught inside the deep midwicket boundary off Hinds --to prompt the declaration. Collingwood added 94 with Pietersen for the fifth wicket, 62 with Prior for the seventh wicket, and the same amount with Broad for the eighth wicket, as England extended their innings to an hour and 20 minutes past tea.
At lunch. England had reached 391 for four, after they suffered an early, but not totally surprising setback
The visitors continued from their overnight total of 301 for three, and lost nightwatchman Anderson, when he was caught behind off Edwards for four in the second over of the morning
But Collingwood joined Pietersen and launched into the West Indies attack with a succession of blistering strokes.
Both batsmen were prepared to bring out their pull and hook to good effect, but there were a few crisp drives as well.
They, however, had to survive a torrid opening spell from Edwards in which both were peppered about their body with a couple of short, rising balls.
Pietersen, unusually subdued. was fortunate on 25, when he almost gave a return catch to Edwards looking to drive a low full toss.
SCOREBOARD
Scoreboard at stumps on the second day of the third Test between West Indies and England at the Antigua Recreation Ground on Monday:
ENGLAND: First innings (overnight 301 for 3)
Strauss c & b Edwards 169 Cooke Smith b Gayle 52 Shah run out 57
Pietersen b Taylor 51
Anderson c Ramdin b
Edwards 4
Collingwood c Smith b Hinds 113
Flintoffb Taylor 0
PriorcChanderpaulbNash 39 Broad c Ramdin b Hinds 44 Swann not out 20
Extras: (b-10, lb-1, w-1, nb-5)17 Total: (For 9 wkts deci in
165.2 overs) 566
Did not bat: Harmison.
Fall of wickets: 1-123, 3-295, 4-311,5-405, 6-405,7-467,8-529, 9-568.
Bowler O M R W
Taylor 28 7 73 2
Edwards 26 2 75 2
Powell 26 3 103 0
Gayle 13 1 41 1
Benn 39 5 143 0
Hinds 22.2 4 86 2
Nash 11 2 34 1
WEST INDIES: First innings Gayle c Anderson b Harmison 30
Smith not out 10
Powell not out 2
Extras: (b-4,w-l,nb-8) 13
Toyak(Forlwktinl3overs) 55 To bat: Sarwan, Hinds, Chanderpaul. Nash, Ramdin, Taylor, Benn. Edwards.
Fall of wickets: 1-45.
Bowler O M R W
Anderson 4 0 9 0
Flintoff 5 0 22 0
Harmison 3 0 18 1
Broad 10 2 0