& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

MU stroll past Derby

AFP, London
Manchester Uniteri's bid for a remarkable haul of five trophies in one season remains on course after Sunday's 4-
1 win over Derby in the FA Cup fifth round.
Having already won the Club World Cup in December, Sir Alex Ferguson's side sit top of the Premier League, face Tottenham in the League Cup final and take on Inter Milan in the Champions League second round.
Now they are through to the FA Cup quarterfinals as well thanks to goals from Nani, Darron Gibson, Cristiaho Ronaldo and Danny Welbeck at Pride Park.
United were took the lead in the 29th minute when Giggs slipped a pass to Nani on the edge of the Derby area. The Portuguese winger cut inside and lashed a superb strike past Stephen Bywater.
Gibson added a second goal
in the 44th minute when he volleyed home from Ronaldo's deflected freekick.
Ronaldo got on the score-sheet himself three minutes into the second half with a powerful header from Giggs' comer.
Miles Addison's 56th minute header was no consolation for Nigel Clough's Derby, who also lost to United in the League Cup semifinal earlier this season, and highly-rated young winger Welbeck curled home a sublime fourth in the 81st minute.
Australia midfielder Tim Cahill scored the decisive goal as Everton booked their place in the FA Cup quarterfinals with a 3-1 win over Aston Villa.
Cahill struck with 14 minutes remaining to put the fifth round result beyond doubt at Goodison Park after Mikel Arteta's penalty had put Everton ahead for the second time.
Teenage midfielder Jack Rodwell gave Everton the perfect start as he scored his first goal for David Moyes' team in the fourth minute.
Cahill met Arteta's comer with a bullet header that
Stiliyan Petrov could only clear off the line to Rodwell, who lashed the loose ball back into the net from close range.
Villa equalised when Tony Hibbert chopped down Gabriel Agbonlahor in the eighth minute and James Milner's low penalty trickled under Tim Howard.
Everton, who last reached the quarterfinals in 2002, went back in front in the 24th minute through another penalty. This time Villa midfielder Steve Sidwell brought down Victor Anichebe and Arteta stroked home the spot-kick.
Cahill sealed the win after 76 minutes when he sprayed a pass wide to Anichebe and burst into the area to finish the striker's return pass with a scuffed shot.
Chelsea are the only other team definitely into the last eight after beating Watford 3-1 on Saturday.
Blackbum rescued a 2-2 draw with Coventry, West Ham drew 1-1 with Middlesbrough, Fulham were held to a 1 -1 draw at Swansea and Hull were forced to settle for a 1-1 draw against Sheffield United.