& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Strauss's ton of double impact

AFP, St John's
"On this pitch it is not that easy to get ones, it's easier to get boundaries than get ones.
"And once me and Cooky (Alastair Cook) were . in we
Skipper Andrew Strauss's 15th Test hundred helped England bury the double misery of their Jamaica humiliation and the abandoned second Test on the opening day of the third Test on Sunday.
Strauss hit 169, and there were half-centuries for Owais Shah and Alastair Cook, as England, sent in to bat by the West Indies, reached 301 for three in their first innings when stumps were drawn at the Antigua Recreation Ground.
Strauss turned his overpitched 169th delivery from Daren Powell through backward square leg for two to reach the milestone to help make his team's 51 all out in the firstTest, and Friday's aborted Test, a distant memory.
He put on 123 for the first wicket with Cook before Shah, who was replacing Ian Bell, joined him to add 153 for the second wicket before they both departed in the final period of the day.
"It was important we came out positive today just to show there is a lot of fight in us and we did that from ball one," said Strauss. decided that if the shot was on we should back ourselves and go for the shot."
But Strauss was fortunate. On 47, West Indies captain Chris Gayle dropped him at slip off Sulieman Benn before he steered Jerome Taylor to third man for two to bring up his 50.
Then on 71, he edged Ryan Hinds between wicketkeeper Denesh Ramdin and slip fielder Gayle for the 10th of his 24 fours before he reached triple figures.
Strauss and Cook had provided England with a firm foundation. They carried England to 58 without loss at lunch before Cook was caught at slip off Gayle for 52 after the interval.
Shah entered and immediately announced himself with a cracking back-foot drive off his first ball from Gayle.
They took England to 206 for one at tea before Shah was run out for 57, when he failed to beat a direct hit from Taylor on his follow-through going for a suicidal run.
Strauss continued to stroke the ball crisply, but Gayle claimed the second new ball with England on 291 for two after 87 overs and was rewarded with the prized scalp of the left-handed opener.
Trying to pull a short, rising ball from Fidel Edwards, Strauss only succeeded in giving the bowler a simple
return catch.
He batted for five minutes short of six hours, faced 277 balls, and also struck a six, a lovely straight hit out of the ground off Benn.
The start had been delayed by 45 minutes, following overnight and early morning rain which affected parts of the parched outfield with an area straight behind the wicket at the northern end beingthemosttroublesome.
West Indies made no changes to their 11 that took the field for the second Test, but England brought Steve Harmison and Graeme Swann in to replace Ryan Sidebottom and Monty Panesar.
The ARG was cleared to stage the match late on Saturday, following an inspection from ICC Match Referee Allan Hurst.
"I'm very happy with the ground," he told reporters. "I think in the 24 hours they've had to prepare the ground they’ve done a fantastic job.
"There are a few problems with the (outfield) and it is not perfect, but they've done as good a job as they could have and the pitch looks great."
The ARG is hosting a Test for the first time in three years, after the secondTest at the nearby Sir Vivian Richards Cricket Ground was abandoned on Friday because of an unsuitable outfield after just 10 balls.
West Indies lead the series which now comprises five Tests 1-0, following an innings and 23-run victory in the opening match at Kingston inside four days.
The other two Tests in the series take place at Kensington Oval in Barbados from February 26 to March 2, and Queen's Park Oval in Trinidad from March 2 to 6.
SCOREBOARD
Scoreboard at stumps on the first day of the third Test between West Indies and England at the Antigua Recreation Ground on Sunday: ENGLAND: First innings Strauss c&b Edwards 169
Cooke Smith b Gayle 52
Shah run out 57
Pietersen not out 8
Anderson not out 3
Extras: (b-6,w-l,nb-5) 12
Total: (For 3 wkts in 92 overs) 301
To bat Collingwood, Flintoff, Prior, Broad, Harmison, Swann. Fall of wickets: 1-123,2-276,3-295.
Bowler O M R W
Taylor 15 3 37 0
Edwards 15 2 41 1
Powell 11 2 40 0
Gayle 12 1 35 1
Benn 17 2 62 0
Hinds 15 2 59 0
Nash 7 2 21 0
WEST INDIES: Gayle, Smith, Sarwan, Hinds, Chanderpaul, Nash, Ramdin, Taylor, Benn, Powell, Edwards.