& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Butt won't resign

3CB boss, Miandad at loggerheads

Agencies, Karachi
Pakistan Cricket Board (PCB) chairman Ijaz Butt has dismissed calls for his resignation by members of the Senate Standing Committee on Sports, claiming that he continues to have the backingofPCB chief patron Asif Ali Zardari.
The senators tore into Butt and other officials at a special hearing on Monday and blamed them for the poor state of affairs in the cricket board. But Butt made it clear he had no intentions to resign.
"Why should I resign? I will continue to work until I enjoy the confidence of the chief patron of the board (President Asif Ali Zardari)." he told reporters after the hearing.
Me and my team are doing everything to streamline cricket affairs in the country and for this we need some time. We can't produce results overnight," Butt, aformerTest player, said.
Butt was to hojd a press conference later Tuesday to clarify certain points made after the senate hearing.
Earlier on Monday senators demanded that
President Asif Ali Zardari sack the cricket board, branding its officials incapable and accusing them of making a mess of the national game.
The senate committee held a highly-charged session to probe falling standards of the national cricket team, fears of bankruptcy in the PCB and reasons why its director general resigned.
Pakistan crashed to their lowest one-day score at home when they were dismissed for 75 in the series-deciding one-day match against Sri Lanka in Lahore last month which led to their heaviest defeat in limited overs cricket by 234 runs.
In the aftermath, captain Shoaib Malik was replaced by senior batsman Younis Khan.
"Financial mismanagement has been there for a long time now, but this current set-up of the PCB is incapable and if they remain in charge, cricket will be completely destroyed,” Senator Enver Baig told reporters.
"I request the President to reconsider the appointment of Ijaz Butt as chairman," said Baig. Butt was appointed PCB chairman last October.
"Good cricketers cannot be good administrators and so it's proved," hesaid, "Butt's appointment was political and we request the president to change it," Senator Tahir Mashhadi told the meeting.
Another senator said fears that the PCB was going bankrupt were false.
"The current bank balance of the PCB is 2.7 billion (34.15 million dollars) and so fears of the PCB going bankrupt were unfounded." said Haroon Akhtar.
Butt claimed last month that PCB's reserves had fallen from 3.3 billion to 1.5 billion rupees over the past two years after several teams refused to tour Pakistan over security fears.
Akhtar also refuted Butt's claims that renovation of Gaddafi Stadium, in the eastern city of Lahore and the biggest in Pakistan, had run over budget..
"We had summoned the architect and former chief operating officer Shafqat Naghmi who told the house that the project can be com-
pleted in 31 million rupees and not in 47 million as claimed by the PCB," said Akhtar.
Referring to PCB director general Javed Miandad's resignation last month, Butt told the house that the former great's appointment was a "bigmistake."
"I accept that appointing Miandad without a valid contract was the biggest mistake of my life. Miandad was demanding 1.6 million rupees (20,000 dollars) which was not acceptable,' said Butt.
Miandad was appointed director general in November but resigned protesting that he had been unable to change the structure of Pakistan cricket.
"I did not resign over money," he told the meeting.
'The scope of work given to me initially was totally different from the one which was written in my contract. The PCB wanted to confine me to domestic affairs which was not acceptable to me," Miandad added.