& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

India go 2-0 up

AFP, Colombo
Sri Lanka's Thilina Kandamby smashed a solid 93 not out under pressure, but failed to stop India from posting a 15-run victory in the second one-day international here Saturday.
The tourists restricted Sri Lanka to 241 after scoring 256-9 in a day-night match, which was held up for five minutes during the hosts' innings after Indian fielder Ishant Sharma was struck by an object from the stands.
The 20-year-old paceman Sharma (4-57) was the bowl ing star for India, who now lead 2-0 in the five-match series.
Indian fast bowlers Zaheer Khan, Praveen Kumar and Sharma did the early damage, exploiting the conditions well under lights during their sharp opening spells to reduce the hosts to 36-3 in the eighth over.
Left-handed Kandamby sustained his team's hopes with a 100-run stand for the fourth wicket with skipper Mahela Jayawardene, who regained form with 52 - his first half-century in 14one-dayers.
But the asking rate kept climbing despite impressive knocks from JayaWardene and Kandamby, with Sri Lanka needing 91 to win with six wickets in hand in the last 10 overs.
India strengthened their position when man-of-the-match Sharma removed Chamara Kapugedera (31) and Farveez Maharoof (seven) in successive overs.
Kandamby, playing only his ninth one-dayer, hit nine fours in his 129-ball knock for his second half-century.
India earlier rode on Yuvraj Singh's 66 to post a competitive total after electing to bat.
The middle-order batsman's 38th half-century came after his side had lost three wickets for 83 runs. He steadied the innings with an 85-run stand for the fourth wicket with Suresh Raina (29).
Yuvraj applied himself remarkably well on a slow pitch and reached his half-century in style, driving off-spinner Muttiah Muralidaran through the covers for a four.
Yuvraj hit one six and seven fours in his 88-ball knock before falling to a dubious decision, adjudged leg-before by Sri Lankan umpire Gamini Silva off paceman Nuwan Kulasekara. The TV replays suggested the batsman had inside-edged the delivery on to his pads.
India managed just 46 in the closing 10 overs as seamer Maharoof (2-40) and Muralitharan did not allow the batsmen to score freely.
Record-seeking Muralidaran went wicketless but conceded only 32 in his 10 tight overs. He is still two wickets short of surpassing former Pakistani paceman Wasim Akram's world record of502.
India got off to a brisk start as they raced to 83 off 12.2 overs but lost three big wickets in the process.
Virender Schwag (42) and Gautam Gambhir (27) punished Sri Lanka's new-ball bowlers with their bold strokeplay after die third-over dismissal of Sachin Tendulkar (six), trapped leg-before by Kulasekara.
Kulasekara was replaced by Maharoof after conceding 42 in his opening six overs. Maharoof struck instantly,
having Gambir caught behind with his third delivery.
Sehwag's flourish ended when he was caught short of the crease while going for a third run. He hit seven fours in his 26-ball knock.
Complete scoreboard of the second one-day international between Sri Lanka and India at R Premadasa Stadium in Colombo on Saturday:
INDIA
Sehwagrunout 42
Tendulkar lbw b Kulasekara 6 GambhircSangakkara b Maharoof 27 Yuvraj lbw b Kulasekara 66 Raina cKapugederab Dilshan 29 Dhoni c Sangakkara b Maharoof 23 Yousuf run out 21
ZaheercDilshanbMendis 17
KumarcJayawardenebMendis 15 Ojhanotout 0
Extras: (b-l,nb-l,w-8) 10
Total (For 9 wickets in 50 ovors) 256 Fall of wickets: 1-13, 2-62. 3-83.4-168,5-180, 6-219,7-223, 8-256,9-256 Bowler O M R W
Kulasekara 9 0 61 2
Thushara 8 0 59 0
Maharoof -10 0 40 2
Mendis 10 0 44 2
Muralidaran 10 1 32 0
Dilshan 3 0 19 1
SRI LANKA
Dilshan c Sharma b Zaheer 8
Jayasuriya cOjhab Sharma 17
Sangakkara cTendulkar b Kumar 4
Jayawardenec Pathan bOjha 52
Kandambynotout 93
Kapugederac Dhoni b Sharma 31
Maharoof b Sharma 7
Thushara c Pathan b Sharma 7
Muralidaran run out 3
Kulasekara run out 1
Mendis run out 0
Extras: (b-4,lb-4,w-10) 18
Total: (All out in 49.2 overs) 241 Fall of wickets: 1-15, 2-33, 3-36, 4-136, 5-187, 6-206, 7-228 8 236,9-237
Bowler O M R W
Zaheer 10 0 56 1
Kumar 8.2 1 22 1
Sharma 10 1 57 4
Ojha 7 0 39 1
Pathan 5 0 21 0
Sehwag 5 0 19 0
Raina 4 0 19 0
Result: India won by 15 runs.
Man-of-the-match: Isham
Sharma (India)
Umpires: Brian Jerling and Gamini Silva.