& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Dhoni for changes

CRIClNFO, undated
With his side sealing the seven match series 4 0, Mahendra Singh Dhoni, the Indian captain, on Sunday said the team will look to field the unused players In the squad for the upcoming games against England.
"You will see a few changes in the side in the next three matches. Some of the people who have not played in the series so far will play but we still look to win games," he said. "Three more matches to come and we want to win those games."
Hie game in Bangalore was reduced to a 22-overs-a-side contest, and Dhoni felt his fast bowlers stood up on a day when the spinners found it tough in wet conditions. "Because of the wet outfield, the ball became soggy and it was not easy to grip the ball," he said.
"We have one specialist spinner [Harbhajan Slngh| and part-time spinners, it was really difficult for them. But then Zaheer [Khan| bowled very well, along with Ishant [Sharmal and Munaf [Patel). Overall it was a very good team effort."
Dhoni marshalled his bowlers well during the chase, and praised Zaheer for guiding the other bowlers.
"I was not giving much advice. First 1 like them to bowl to their own plans and if that does not work I ask them to bowl according to my plans.
"But Zaheer has been of great help throughout the series and has taken the extra initiative to help others. It has worked for us and we should be thankful to him."
SCOREBOARD
Scoreboard of the fourth one-day international between India and England at M Chinnaswamy Stadium in Bangalore on Sunday:
INDIA
Sehwagc Anderson b Swann 69
Tendulkar b Broad 11
Gambhirc Anderson b Swann 40
Yuvraj not out 25
Dhoni b Patel 9
Pathan not out 6
Extras: (b-1, lb-1, w 4) 6
Total: (For four wkts in 22 overs) 166
Fall of wickets: 1-38,2 117,3-142,4 160.
Bowler O M R W
Anderson 5 0 33 0
Broad 6 1 49 1
Flintoff 5 0 20 0
Patel 3 0 24 1
Swann 2 0 21 2
Pietersen 1 0 17 0
ENGLAND
Bopara c Sharma b Patel 1
Bell b Harbhajan 12
Shah cTendulkarb Zaheer 72
Pietersen b Sharma 5
Flintoffc Zaheer b Sharma 41
Collingwood cTendulkarb Patel 22
Patel cGambhirb Zaheer 11
Swann run out 5
Prior not out 0
Broad notout 0
Extras: (b-3,lb-2,nb-1, w-3) 9
Total: (For eight wkts in 22 overs) 178
FaU of wickets: 1-1, 2-44, 3-52, 4-134, 5-141, 6-161,7-178,8-178.
Bowler O M R W
Zaheer 5 0 20 2
Patel 4 1 22 2
Sharma 5 0 41 2
Pathan 1 0 17 0
Harbhajan 4 0 42 1
Yuvraj 3 0 31 0
Result: India won by 19 runs (D/L method) and led the7-match series 4-0.
Man-of-the-match: Virender Sehwag.
Toss: England
Umpires: Daryl Harper (AUS) and Amiesh
Saheba(lND)