& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Dortmund up to fourth

Internet, undated
Borussia Dortmund moved up to fourth in the Bundesliga table after Mohammed Zidan's first-half goal gave them victory away to struggling Karlsruhe on Friday night.
The Egyptian swept home
Tamas Hajnal's pass in the 20th minute to move the visitors to within four points of league leaders Bayer Leverkusen.
Karlsruhe, though, have now not won in eight games - taking just one point from a possible 24 in the process - and remain in the relegation zone.
The hosts could have gone ahead in the eighth minute when Godfried Aduobe forced Dortmund keeper Roman Weidenfeller to tip his header over the bar.
But Dortmund, and Zidan in particular, soon began to assert their authority.
The former Hamburg man fired wide after a defensive error and was then shut out by keeper Markus Millerafterbeingput through on goal.
Sebastian Freis volleyed into the side netting from a tight angle as Karlsruhe threatened
briefly at the other end, but the lively Zidan was not out of the action for long.
Hajnal's low cross from the right picked him out in the centre of the area and he slotted the . ball past Miller.
Hajnal almost created a second for Neven Subotic before the break, but Neven Subotic headed wide from his inswinging corner. 1
Karlsruhe, knowing even a point would move them out of the bottom three, came out fighting | for the second half and Weidenfeller had to be alert to first save Antonio Da Silva's free-kick and I a minute later Michael Mutzel's left-foot volley, which he fumbled but managed to keep out
Dortmund might have settled the contest in . the 58th minute, though, when Zidan dribbled half the length of the pitch before unselfishly cutting the ball back to the edge of the centre penalty area to Nuri Sahin, whose effort was parried by Miller.
The home side had a goal disallowed four i minutes later when Edmond Kapllani found the net with a low finish only to be rightly flagged offside.
Miller again came to his side's rescue when he tipped Jakub Blaszczykowski's shot round a . post, but his teammates could not find the equaliser.