& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

WI ride on Taylor

AFP, Abu Dhabi
West Indies bowled a disciplined line and length to dismiss Pakistan for 232 in the second one-day international at Sheikh Zayed Stadium here on Friday
Fast bowler Jerome Taylor overcame a final over glitch in the previous match to take 3-38 and was ably supported by Daren Powell 3 50, as they never allowed the Pakistani batsmen liberty on a docile pitch.
Pakistan, who had collapsed to seven for two in the third over, were indebted to Misbahul Haq (52), Kamran Akmal (45) and Younus Khan (34) but none could play long enough for a big total after Pakistan won the toss and batted.
Younus and Haq staged a little recovery through a 51-run third wicket stand before both fell to injudicious shots. Younus played across to Daren Powell, while Haq miscued a drive off spinner Nikita Miller and was caught in the deep.
Younus hit five boundaries while Haq managed just one during his slow86-ball knock.
Pakistan were further jolted when captain Shoaib Malik was run out for ten.
FROM PAGE 17
It was left to Akmal, who hit Taylor for two sixes in the 50 th over to give Pakistan an unexpected win in the first match on Wednesday, and Shahid Afridi (28) to give some respectability to the innings.
They shared a rapid 52-run stand and threatened for more but West Indies hit back, dismissing both in the space of just two runs.
Sohail Tanveer (26) used the long handle effectively, hitting Taylor for three boundaries in the 48th over before he was run out.
Pakistan leads the three-match series 1-0.
SCOREBOARD
Scoreboard of the Pakistan's innings in the second day-night international against the West Indies at Sheikh Zayed Stadium on Friday:
PAKISTAN
Buttc&bTaylor
Manzoor b Powell 0
Younis Khan b Powell 34
Misbahulc Powell b Miller 52
Malikrunout 10
Akmal b Baker 45
Afridi c Baugh b Taylor 28
Tanveerrunout 26
Iftikhar c Baugh b Taylor 7
Gul c Gayle b Powell 13
Ajmal not out 4
Extras: (lb-3,nb-l,w-2) 6
Total: (All out in 49 overs) 232
Fall of wickets: 1 -7, 2-7, 3-58, 4-8(>. 5-125,6-177,7-179,8-199,9-218.
Bowler O M R W
Powell 8 0 50 3
Taylor 9 1 38 3
Baker 10 0 35 1
Miller 10 0 40 I
Gayle 10 0 43 0
Sarwan 2 0 23 0
Toss: Pakistan
Umpires: Steve Davis (AUS), Daryl Harper (AUS)