& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Kaka inspires Brazil

AFP, San Cristobal
World player of the year Kaka returned after an 11 - month International absence to inspire five-time champions Brazil to a 4-0
World Cup qualifying victory over Venezuela here on Sunday.
The 26-ycar-old AC Milan star was on target after just five minutes and set up the third goal as Brazil moved back into the second place in the South American standings with 16 points, four behind leaders Paraguay.
Manchester City ace Robinho also grabbed a share of the headlines with two sublime goals.
Venezuela came into the match buoyed by having won 2-0 in a friendly between the two nations in Boston last year, their first ever victory ending a run of 17 successive defeats against, their illustrious
rivals.
I lowever, within 20 minutes, any hopes Venezuela coach Cesar Farias had off overseeing another shock were extinguished.
With just six minutes gone, Kaka beat goalkeeper Renny Vega with a shot from a difficult angle which went in off the post. It was the AC Milan star's 23rd international goal in his 60th appearance.
Four minutes later, Robinho made it 2-0 when he cut inside from the left and drove the ball into the back of the net from 30 yards.
By the 20th minute, it was 3-0 with troubled striker Adriano, recalled this year after a series of fitness and disciplinary problems, finding the net from close range.
Kaka had broken from midfield and sent Elano, another Manchester City player on the pitch, free down the left-hand side.
His shot fell invitingly for Adriano to beat Vega and to justify his selection by coach Dunga who
was deprived of the Injured Luis Fabiano.
Venezuela had chances to hit back before half-time as Brazil's defensive frailties looked in danger of being exposed, but Alejandro Guerra, Jorge Rojas, Juan Arango and Giancarlo Maldonado all wasted opportunities.
Adriano was booked on the stroke of half-time which means he will be suspended for Wednesday's visit of Colombia.
Brazil keeper Julio Cesar was twice called on early in the second half to save from Maldonado at close range.
Venezuela, the only South American team never to have played in a World Cup, paid for their wastefulness after 69 minutes when Robinho added his second goal of the night being put through by Kleber.
Robinho controlled |he bail superbly, steadied himself and slotted the ball into the comer of the