& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Ansar, security guards clash in Ctg: 15 injured

CU Correspondent
About 15 people, including five Ansar men, were injured in a clash between them and the security guards of Foy's Lake Amusement Park in the port city in the early hours of yesterday.
After the clash, the Ansar men opened fire and torched three shops at the colony adjacent to the park where some of the security guards lived in rented houses, sparking panic among the people of the area, local people alleged.
The injured Ansar men were identified as Pradip Kumar Das, Saiful Islam, Samiul Islam, Mashiur Rahman and Khalilur Rahman while the injured security guards were Abul Kashem, Mohammad Harun, Tajul Islam, Nur Nabi and Mannan.
Local residents autorickshaw driver Abul Kashem, Mamtaz Begum, Harun and Sujan were also injured during the clash.
Sources said the clash ensued centring a trilling matter among two Ansar men and security guards deployed inside the amusement park.
Witnesses said Ansar men Samiul and Zia locked into an altercation with the security guards Kamal Hossain and Abul Hossain when the Ansar men tried to go to their camp before completingtheirdptyat5:00am. ’
Av one stage, the Ansar men started beating the guards and informed the matter to their camp inside the Park.
Hearing the news, Ansar men from the camp rushed to the spot and swooped on the security guards and the clash ensued. They also opened blank fire to disperse the guards.
The guards took position at the nearby Akbar Colony for cover, but the Ansar men beat the inhabitants of the colony indiscriminately and torched three shops there, alleged locals.
Later, police and members of Rapid Action Battalion (Rab) rushed to the spot and brought the situation under control.
Six of the injured were sent to Chittagong Medical College Hospital (CMCH) while the rest received first aid.
Concerned Concord Entertainment Company Limited Executive Director Major (Retd) Mojaffar Ahmed said that they were trying to setde the matter.
"After the incident, we have withdrawn all the Ansar men from the camp inside the park and replaced them with security forces from private organisation," Mojaffar said, adding that they would form a probe body to investigate into the incident.
However, District Ansar Adjutant MM Lablur Rahman said that the security guards along with the locals attacked the Ansar men that prompted them to open fire.
"We would investigate into the matter and action would be taken against the Ansar men if their involvement is found," he added.
A total of 50 Ansar men and 82 security guards worked for maintaining security inside the park