& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Transformer glitch shuts down biggest atom smasher

AP, Geneva
The world's largest particle collider malfunctioned within hours of its launch to great fanfare, but its operator didn't report the problem for a week.
In a statement Thursday, the European Organisation for Nuclear Research reported for the first time that a 30-ton transformer that cools part of the collider broke, forcing physicists to stop using the atom smasher just a day after starting it up last week.
The faulty transformer has been replaced and the ring in the 17-mile circular tunnel under the Swiss-French border has been cooled back down to near zero on the Kelvin scale minus 459.67 degrees
Fahrenheit the most efficient operating temperature, said a statement by CERN, as the organization is known.
When the transformer malfunctioned, operating temperatures rose from below 2 Kelvin to 4.5 Kelvin extraordinarily cold by most standards, but warmer than the normal operatingtemperature
CERN had not reported any problems with the project since its launch Sept. 10, but issued its statement shortly after The Associated Press called asking about rumours of troubles.
Physicists said it wasn't surprising problems would occur in get-tingahugeand immenselycompli-cated collection of equipment like the Large Hadron Collider up and
running smoothly.
"This is arguably the largest machine built by humankind, is incredibly complex, and involves components of varying ages and origins, so I'm not at all surprised to hear of some glitches," Steve Giddings, physics professor at University of California, Santa Barbara. "It's a real challenge requiring incredible talent, brain power and coordination to get it running."
Judith Jackson, spokesman for the Fermi National Accelerator Laboratory in Batavia, Ill., echoed that view.
"We know how complex and extraordinary it is to start up one of these machines. No one's built one of these before and in the process of starting it up there will inevitably be glitches," she said.
Fermilab is home to the Tevatron, an accelerator that collides protons and antiprotons in a 4 mile-long underground ring to allow physicists to study subatomic particles. Jackson said transformer malfunctions can be common and aren't dangerous.
"These things happen," she said. "It's a little setback and it sounds like they've dealt with it and are moving forward."
The Large Hadron Collider is designed to collide protons in the beams so that they shatter and reveal more about the makeup of matter and the universe.
After it was started up Sept. 10, scientists circled a beam of protons in a clockwise direction at the speed of light. They shut that down, then turned on a counterclockwise beam.
"Several hundred orbits" were made, CERN's statement said.