& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Lezak keeps Phelps' dream alive

AP, Beijing
With history about to slip away and Michael Phelps cheering him on, Jason Lezak pulled up next to the lane rope and set out after hulking Alain Bernard, like a NASCAR driver drafting down the back-stretch at Daytona.
Only 25 metres to go, half the length of the pool. Every stroke brought Lezak a little closer, a little closer, a little closer, his body seem-ingly carried along by the Frenchman's massive wake. The two lunged for the wall together. When the result flashed on the board, Phelps was still on course for his record eight gold medals.
By a fingertip.
Lezak, the oldest man on the US swimming team, pulled off one of the great comebacks In Olympic history Monday morning, hitting the wall just ahead of Bernard in the 400 freestyle relay, a race so fast it actually erased two world records.
Few sporting events live up to the hype -- this one exceeded it. The 32-year-old Lezak was nearly a body length behind Bernard as they made the final turn, but the American hugged the lane rope and stunningly overtook him on the very last stroke.
Wow!
"This has been happening my whole career," Lezak said. "People have gotten on my lane line and sucked off of me, so I figured this is the one opportunity in my whole career to do that."
Watching on deck, Phelps let out a resounding "Yeaaaaaah!" and thrust both arms toward the roof of
FROM PAGE 1
the Water Cube. Uis quest to break Mark Spitz's record of seven gold medals had survived what will likely be its toughest test -- and almost certainly its most thrilling.
The Americans shattered the world record set by their "B" team the previous evening in the preliminaries. touching with a time of 3 minute. 8.24 seconds - nearly 4 full seconds below the 15-hour-old mark of3:12.23.
■Unbelievable." said Phelps, who swam the leadoff leg and then became the team's biggest cheerleader 'Jason finished that race rbetter than we could even ask for. I was fired up. Going into that last 50. I was like. Aw, this is going to be a close race.' Jason's last 10 or 15 metres were incredible. “
The Americans won the relay at seven straight Olympics, but watched the Australians and South Africans take gold at the last two games.
’You could tell 1 was pretty excited." Phelps said. "I lost my voice and 1 was definitely pretty emotional out there."
Bernard was the world record holder in the 100, but he surrendered that mark as well. Australia's Eamon Sullivan broke the individual record by swimming the leadoff leg in 47.24 --ahead of Bernard's markof47.50.
Oh, by the way. Phelps set an American record leading off. 47.51. But it was Lezak's anchor that everyone will remember. He got down and back in a staggering 46.06, the fastest relay leg in history though it doesn't count as an official record.
► "A fingertip did the victory," said Amaury Leveaux, one of the French swimmers. "It is nothing."
Lezak looked at the scoreboard, then leaped out of the water with an emphatic fist pump.
"I knew I was going to have to swim out of my mind." Lezak said. "Still right now, I'm in disbelief."
Garrett Weber-Gale and Cullen Jones also did their parts on the middle legs of the relay, overcoming the enormous pressure of making sure they didn't mess up Phelps's attempt to take down the Holy Grail of Olympic records. Jones was the only holdover from the team that swam in the prelims.
Lezak should get a share of that 1 -mrfliorr-dollar bonus tljat Phelps h‘as been promised if he goes on to beat Spitz’s mark.
"I never lost hope." said Lezak. who trains alone but has been a longtime stalwart on the relay team. "I don't know how I was able to take it back that fast, because I've never been able to come anywhere near that for the last 50."
While the Americans whooped it up on deck. Bernard clung to the wall, his head down. The swimmer who had talked confidently of beating the Americans — "smashing" them, some media reported --was the last one to leave the pool.
"Alain is wounded. When you are the last swimmer in a relay and that you have the opportunity to bring a title of this importance to your country, you don't get out of this unhurt." said Claude Fauquet, France's team director. "But I don't think that Alain lost the race. It's Lezak who won it."
The French were second in 3:08.32 -- eight one-hundredths of a second behind. Australia took the bronze in 3:09.91. In fact, the top five all went below the record set Sunday.
"I felt I was in the lead," Bernard said. "I knew I had to accelerate, but it got harder."
Katie Hoff was again denied a gold medal when Rebecca Adlington of Britain rallied over the final 50 metres to overtake the 19-year-old, who had settled for a bronze the previous day in the 400 individual medley.
Adlington won in 4:03.22, while Hoff took the silver in 4:03.29.
Adlington's teammate Joanne Jackson earned the bronze in 4 03.52. Defending champion I.aure Manaudou finished last in the eight-woman final.
Hoff still has three more individual events, plus a relay.
"1 was a little disappointed 1 was so close," she said." But 1 got a bronze yesterday and a silver this morning. If 1 keep climbing at this pace, TH be happy."
US President George W. Bush was back at the Water Cube for the second day in a row, with wife Laura on one side, daughter Barbara on the other. Former Republican presidential candidate Mitt Romney and his wife were sitting in front of them, and Bill Gates was right behind.
Clearly, the swimming record book will need some heavy revisions by the time the Beijing Olympics are over.
Two more world marks fell Monday morning when Kosuke Kitajima of Japan finished off American Brendan Hansen’s hopes of an individual medal, winning the 100m breaststroke in 58.91 Kitajima pounded the water defiantly and let out a scream after breaking Hansen's 2-year-old record of 59.13.
Hansen was left without a medal, fading to fourth behind silver medalist Alexander Dale Oen of Norway and Hugues Duboscq of France, who took bronze.
Kirsty Coventry didn't even bother waiting until a final to set a record in the 100m backstroke. The Zimbabwean won her semifinal heat in 58 77, taking down Natalie Coughlin's mark of 58.97 set at the US trials last month.
They'll go head to head in Tuesday morning's final. Coughlin won her heat in 59.43.
Seven world records have been set through the first 21/2 days at the Water Cube.
While Hansen still has a swim left in the medley relay, he'll go down as one of the major disappointments of the American team. A one-time world record holder in both the 100m and 200m breast-strokes, he didn't even qualify for the Olympics in the longer race.
Putting all his hopes of beating Kitajima in the 100m, he wasn't close to the Japanese star, finish- I ing0.66 seconds behind.
i 5jUbbyofAustraliajust, missed another world record in the women's 100m butterfly, winning gold with a time of 56.73. American Christine Magnuson claimed the silver (57.10) and another Aussie, Jess Schipper, took the bronze (57.25).