& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

LDU win Copa Libertadores

Football

AFP, Rio De Janeiro
LDU became the first Ecuadorean club to win the Libertadores Cup, beating Brazil's Fluminense on penalties after losing the second leg of the final 3-1 on Wednesday.
Fluminense midfielder Thiago Neves scored a hat-trick as the seesaw tie finished 5-5 on aggregate but his efforts were in vain as LDU won the shootout 3-1 to stun the 86,000 crowd at the Maracana.
Leading 4-2 from the first leg. LDU scored in the fifth minute through striker Luis Bolanos but then fell apart.
Flujninense, whose coach Renato had guaranteed victory before the game, netted three goals in less than an hour and looked certain to complete the job.
But they ran out of steam and failed to score in the remaining half hour of normal time or in extra- time.
Three of their four kicks were saved by LDU goalkeeper Jose Ccvallos in the shootout, including one from Neves.
"I scored three goals but they weren’t worth anything because we didn't win the trophy," Neves told reporters.
LDU were presented with the trophy in a nearly empty' stadium around 20 minutes after the end of the game, the crowd having left en masse as soon as the penalties finished.
The match began lOminuteslatc as officials tried to move a group of photographers who were in the wrong position on the touchline.
LDU stnick when Joffre Guerron made one of his trademark runs down the right and pulled the ball back to Bolanos, who scored with a low shot which took a deflection
Fluminense, who had won all previous six home games in the competition, needed only seven minutes to equalise.
Neves slipped past one defender and scored with a low 25-metre shot as Cevallos was late to react
"Flu" went ahead in the 28th minute when LDU's flat back four was caught out at a throw-in. Cicero broke down the left and found Neves who scored easily from close range.
LDU were by now a collective nervous wreck and it was no surprise when Fluminense levelled the aggregate scores in the 57th minute. Neves floating a 25-metre free kick over the wall and into the corner as Cevallos again reacted slowly.
A decisive Fluminense goal looked only a matter of lime but instead the hosts lost momentum and LDU fought back
Fernando Henrique was forced to turn away a low shot from Patricio Urrutia before LDU forward Claudio Bieler hit the post with a shot on the turn.
In the 116th minute. Bieler headed in from EnriqueV’era’s long cross but the goal was disallowed for offside.
One minute later. Fluminense were close to the settling the match when Neves had a close-range shot saved by Ccvallos.
With the last move of the game, Guerron burst from defence and ran the length of the field before being bundled oxer by Fluminense captain Luis I Jenriquc who was sent oft
Paul Ambrossi fired the free kick into die wall.