& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

INDIA-PAKISTAN SCOREBOARD
Scoreboard of India's innings in the Asia Cup Super League match against Pakistan at National Stadium in Karachi on Wednesday: INDIA Gambhirc Afridi b Iftikhar 35
Sehwagc Sarfraz b Rauf 49
Raina c Butt b Rauf 1
Yuvraj c Sarfraz b Iftikhar 37
Dhoni c Sarfraz b Tan veer 76
R Sharma c Raufb Iftikhar 58
Y Pathan c Jamshed b Ajmal 0
I Pathan not out 38
Kumar not out 1
Extras: (b-l,lb-4,w-8) 13
Total: (For seven wkts in 50 overs) 308 Did not bat: Chawla, I Sharma.
Fall of wickets: 1-88, 2-90, 3-91, 4-129,5-241,6-249,7-290.
Bowler O M R W
Tan veer 10 0 87 1
Rauf 10 0 66 2
Iftikhar 10 1 51 3
Afridi 10 0 52 0
Ajmal 10 0 47 1
PAKISTAN: Misbahul Haq, Salman Butt, Nasir Jamshed, Younis Khan, Mohammad Yousuf, Shahid Afridi, Rao Iftikhar, Sarfraz Ahmed, Sohail Tanveer, Abdur Rauf, Saeed Ajmal.
Toss: India
Umpires: Tony Hill (NZL), Ian Gould (ENG)
TV umpire: Akhtaruddin (BAN) Match referee: Alan Hurst (AUS)