& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

INDIA-PAKISTAN SCOREBOARD
Scoreboard in the final Asia Cup Group B match between Pakistan and India at the National Stadium in Karachi onThursday: PAKISTAN
Butte Raina b Chawla 35
Malik retired hurt 125
Younis c Raina bYusuf 59
Yousuf run out 30
Misbahnotout 31
Afridi c Dhoni bRP Singh 9
Tanveernot out 3
Extras: (b- 1,1b-l,w-5) 7
Total: (For 4 wkts in 50 overs) 299
Did not bat: Alam, Sarfraz, Gul, Iftikhar
Fall of wickets: 1-90, 2-223, 3-261, 4-290
Bowler O M R W
Kumar 10 0 56 0
RP Singh 10 2 44 1
Sharma 10 0 69 0
Chawla 7 0 52 1
Yusuf 9 0 52 1
Yuvraj 4 0 24 0
INDIA
GambhircMisbahb Iftikhar 9 Sehwag cYounisb Afridi 119
Raina c Alam b Iftikhar 84
Yuvraj c Butt bTanveer 48
Dhoni not out 26
Rohit not out 0
Extras: (b-l,Ib-6,nb-l,w-7) 15
Total. (For4wkts in 42.1 overs) 301
Did not bat: Yusuf, Chawla, RP
Singh, Ishant, Kumar
Fall of wickets: 1-12, 2-210, 3-231, 4-294
Bowler O M R W
Gul 12 0 6 0
Tanveer 9 0 55 1
Iftikhar 9.4 0 61 2
Afridi 10 0 64 1
Alam 7 0 64 0
Butt 1 0 13 0
Younis 4.1 0 31 0
Result: India won by six wickets Man-of-the-match: Suresh Raina.
Toss: Pakistan.
Umpires: Tony Hill and Brian Jerling.