& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

BANGLADESH-UAE SCOREBOARD
Scoreboard of Bangladesh innings in the Asia Cup Group A match against United Arab Emirates at the Gaddafi Stadium in Lahore on Tuesday:
BANGLADESH
Iqbal run out 40
NazimuddincArshadbShah 2
Ashrafulrunout 109
Raqibulc Amjad b Shah 83
Kapalic&bKhurrum 1
MortazacKhurrumbShah 3
Riyad not out 8
Rahim st Amjad bKhurrum 16
Mahmud run out 20
Extras, fib-2, w-16) 18
Total:(Foreightwktsin50ovefs) 300
Did not bat: Abdur Razzak, Shahdat Hossain.
Fall of wickets: 1-12, 2-107, 3-248, 4-250,5-252,6-257,7-278,8-300
Bowler O M R W
Shah 10 0 49 3
Alhashmi 5 1 21 0
Javed 2 0 24 0
Tauqir 3 0 6 0
Silva 7 0 33 0
Saqib 3 0 13 0
Khurrum 10 0 78 2
Arshad 10 0 74 0
(JAE: Saqib Ali, MohammadTauqir, Arshad Ali, Khurram Khan, Zahid Shah, Amjad Ali, Fahad Alhashmi, Shadeep Silva, Amjad Javed, Vikrant Shetty, Indika Batuwitarachchi.
Umpires: Simon Taufel (AUS), lan Gould (ENG)
TV umpire: Zameer Haider (PAK) Match Referee: Mike Procter (RSA)