& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

End result, no result

AFP, Birmingham
The second one-day international between England and New Zealand ended in a controversial no-result with the game just an over away from being declared a 'match.'
The Black Caps were on 127 for two off 19 overs and needed just seven more off the 20th, assuming they didn't lose a wicket, for victory under the Duckworth-Lewis system.
Although, at that stage, rain was falling heavily the conditions did not appear to be appreciably worse than they had been for some time.
Nevertheless, the umpires then took the players off the field with the game just shy of the 20 overs in the second innings needed fora result
The hard-hitting Brendon McCullum was 60 not out, off 51 balls with five fours, while experienced allrounder Scott Styris was unbeaten on 19.
Had they won this would have been New Zealand's first international win of a tour which saw
them lose theTest series 2-0 and then suffer a nine-wicket defeat in Friday's loneTwenty20.
As it was, England remained 1-0 up in this five-match campaign ahead of the third one-dayer at Bristol.
Any New Zealand sense of injustice would have been fuelled by the fact it took England more than an hour to bowl 14 overs and 83 minutes in all to deliver 19. The International Cricket Council (ICC) says teams should bowl an average of 14.28 per hour.
"For consistency with our rulings earlier in the day, we had to come off.
The two teams were struggling to stand up," Australian umpire Steve Davis, who together with English onfield colleague lan Gould took the decision to call the game off, told Sky Sports.
"The number of balls left shouldn't come into it, if that's the way the conditions are."
Despite the prevailing bad weather, there was still a gap of 30 minutes between the innings when it might have been possible for the teams to turn round in 10.
"That's the standard one-day international playing condition. We couldn'tgobelowthat," said Davis.
Earlier, New Zealand mediumpacer Grant Elliott took three for 23 in five overs on his one-day international debut as England were bowled out for 162 off their 24 overs after rain delayed the start Opening batsman Wright top-scored with an ODIbest52.
South Africa-bom Elliott, 29, only called up into the squad on Monday after playing club cricket In Surrey, south-east England, replaced James Marshall in the only change to the side thrashed by 114 runs at the Riverside on Sunday.
New Zealand, after captain Daniel Vettori won the toss, needed just three balls to take their first wicket
Ian Bell, on his home ground, fell for nought when he was well caught by Vettori, running back from mid-off, after the Warwickshire batsman got a leading edge trying to turn Kyle Mills legside.
Bell's exit brought in Kevin Pietersen, who made 110 not out on Sunday. Before the game there had been talk about whether Pietersen would repeat Sunday's 'switchhitting' exploits which saw him twice strike medium-pacer Styris for si^ while effectively batting lefthanded.
But there were no 'reverse slog sweeps' before Pietersen, on 13, drove Michael Mason's fourth ball straight to Vettori at mid-off.
Wright though launched Mason over extra-cover for four, drove him next ball for six and then, off the third ball of the over, hoisted the seamer for six over square leg after going down on one knee.
The Sussex batsman then completed his fifty when he hammered Mason, whose two overs cost 24 runs, through mid-off for four.
That shot saw the 23-year-old, in his seventh one-day international, surpass his previous best of 50 against India at The Oval in September.
But going for another big hit, Wright gave Elliott his first wicket at this level when he holed out to Styris at long-off.
No sooner was Wright out then rain stopped play with England 77 for three in the 13th over.
When play resumed Elliott captured the key wickets of Owais Shah, lbw for 18, and England captain Paul Collingwood, caught by Daniel Flynn for 37.
SCORES IN BRIEF
ENGLAND: 162 all out in 24 overs (Wright 52, Collingwood 37, Mascarenhas 23; Elliot 3-23, Mills 2-24,Southee2-35)
NEW ZEALAND: 127 for 2 in 19 overs (McCullum 60 not out, Taylor 25; Collingwood 1 -23, Broad 1 -28) Result: Match ended as no result and England lead the five-match scries I-0.
Toss: New Zealand.
Umpires: Steve Davis and Ian Gould.
lhirdODI:Jun21, Bristol.