& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

PCB blasts team

AFP, Lahore
A Pakistan on a official who said he had been accused of leaking a confidential email to the media which criticised the team.
The Pakistan .Cricket Board confirmed that former fast bowler Salim Altaf, who was overseeing the 2011 World Cup to be hosted in the subcontinent, was fired, but a top official played down the incident.
"Altaf s services were no more required but I would not say he was accused of leakage to the media," Pakistan Cricket Board (PCB) chief operating officer Shafqat Naghmi told AFP.
But Altaf said he was sacked after local media published an email by Pakistan's cricket chief accusing the national team of lacking commitment after they suffered their biggest-ever defeat against arch-rivals India this week.
"I have worked to the best of sincerity and honesty but today PCB chairman Nasim Ashraf called me to his office and accused me of leaking news to the media," Altaf told AFP.
"He gave me the option of resigning or else said that he would sack me," Altaf added.
Altaf, 64, who played 21 Tests for Pakistan in the 1970s as a medium
fast bowler, was made director for special projects after serving as chief executive of the PCB until September last year.
Altaf said he would consult an attorney.
’’After I left Ashraf s room he came to my office and told me to read the transcript of a taped conversation which had my voice. He accused me of leaking secrets to the media, "Altaf said.
"I replied that most of the things in the transcript were public knowledge and nothing is proved in the transcript. I will consult my lawyer and then decide my course of action," said Altaf.
India thrashed Pakistan by 140 runs in the tri-series match held in Dhaka, Bangladesh on Tuesday. They posted a formidable 330-8 and then bowled Pakistan out for a paltry 190.
"The performance against India was embarrassing," Ashraf wrote in the email published in the Pakistani media.
"It is not a question of losing a match but our overall performance and the lack of resolve and commitment bothered me the most," it added.
The email, which was addressed to manager Talat Ali and copied to captain Shoaib Malik and Pakistan's Australian coach Geoff Lawson, demanded swift action.
It was unclear how Altaf was alleged to have obtained the email.
"Please discuss these points and give us your considered response within the next 24 hours so that timely action can be taken before the next match against India on the 14th which will be the final," the message said.
India take on Bangladesh on Thursday, with Pakistan set to meet their foes again on Saturday.
"The team selected for India game had four fast bowlers. Also, you clearly told me that Malik was 100 per cent fit and therefore was the second spinner in the side. What happened to that? Why did Malik not bowl?"
Ashraf also lashed out at poor fielding against India. Pakistan dropped three crucial catches to allow the Indian openers Viredar Sehwag (89) and Gautum Gambhir (62) put on 155 for the opening stand.
"We dropped some catches in the beginning as well but, watching from here, one felt that we were paralysed in the field. Nobody suggested to the captain that he must have a mini conference — and take corrective action."
Ashraf criticised die selection of the team, which did not include a regular spinner.
"The previous game against Bangladesh had clearly highlighted the characteristics of the track in Dhaka, that the spinners were going to play a crucial role," said Ashraf of Pakistan's 70-run win over the hosts on Sunday.