& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

NZ crash to Sidebottom

AFP, Nottingham
Ryan Sidebottom's devastating spell of four wickets for five runs in 19 balls propelled England to an innings and nine run third Test victory against New Zealand at Trent Bridge here on Sunday.
England's win, achieved before lunch on the fourth day, saw them take the three-match series 2-0.
Left-arm quick Sidebottom, who finished with figures of six for 77, routed the New Zealand lower order on his Nottinghamshire home ground.
But it was fellow fast bowler and man-of-the-match James Anderson, with aTest best seven for 43 in the first innings, who did the decisive damage that made New Zealand follow-on.
Only all-rounder Jacob Oram, with an unbeaten 39-ball fifty featuring two sixes and six fours offered much resistance Sunday.
New Zealand resumed on 177 for five - still 64 runs shy of making
England bat again — after suffering the double blow of losing both Brendon McCullum (71) and Daniel Flynn (49) shortly before stumps on Saturday.
Wicketkeeper and debutant Gareth Hopkins had added just five to his overnight score of seven when he edged Sidebottom to England gloveman Tim Ambrose. Oram, who made a hundred in the drawn first Test at Lord's, square cut Stuart Broad, a county colleague of Sidebottom's, and then pulled the fast bowler for successive fours.
SCOREBOARD
Final scoreboard on the fourth day of the third Test between England and New Zealand at Trent Bridge on Sunday.
ENGLAND: First innings 364 (Pietersen 115, Ambrose 67, Broad 64; O'Brien 4-74, Mills 3-76) NEW ZEALAND: First innings 123 (Anderson 7-43)
NEW ZEALAND: Second innings (overnight 177-5)
Howe Cook b Sidebottom 19 Redmond cAmbrose b Broad2 McCullum b Anderson71 Taylor lbw b Broad 14
Flynn c Ambrose b Sidebottom49 Hopkins c Ambrose b Sidebottom 12 Oram not out50
Vettori c Pietersen b Sidebottom 1
Mills c Strauss b Sidebottom2 O'Brien c Collingwood b Sidebottom4
Martin c Collingwood b AndersonO Extras: (b-3,Ib-4, w-l)8
Total: (All out in 72.3 overs)232
Fall of wickets: 1-21, 2-33, 3-58, 4-
152, 5-169, 6-197, 7-205. 8-221, 9-225
Bowler O M R W
Sidebottom 24 6 67 6
Anderson 14.3 3 55 2
Broad ) 21 4 77 2 ~
Panesar 11 3 21 0
Collingwood 2 15 0
Result England won by an innings and 9 runs and clinch three-Test series 2-0.
Man-of-the-match: James Anderson.
England man-of-the-series: Andrew Strauss.
New Zealand man-of-the-series:
Daniel Vettori.
Toss: New Zealand.
Umpires: Steve Bucknor and Darrell Hair.