& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Nadal closer to history

AFP, Paris
Rafael Nadal demolished Novak Djokovic 6-4, 6-2, 7-6 (7/3) on Friday to move just one victory away from joining Bjorn Borg as the only man to win four successive French Open titles.
Borg, who completed his sequence from 1978-1981 and picked up six Roland Garros singles titles, was watching from the sidelines as the Spanish second seed claimed his 27th win in 27 Roland Garros matches.
The 22-year-old will now face either top seed Roger Federer, who has lost the last two finals to the Spaniard, or unseeded Frenchman Gael Monfils, in Sunday1 s title match.
The level of the first two sets was almost perfect. But the third set was tough and he started to play very well," said Nadal who had
been a double break ahead in the third before Djokovic rallied, holding a set point in the 12th game.
"I was 3-0 ahead but then I played a very bad game. Maybe I got nervous because if I was 4-0 ahead, the match was over. He had a set point when I thought I had the match under control.
"But I still knew that it would be complicated for him. If he won that set he would have to keep playing like that for two more sets."
Djokovic, the third seed from Serbia, had high hopes of ending the Spaniard's unbeaten record in Paris and taking the champion's world number two ranking.
Playing in his fifth successive Grand Slam semi-final, he was also buoyed by having pushed Nadal to a three-set decider in the last four at Hamburg on the eve of Roland Garros.
But, apart from his belated third set charge, he was completely outplayed.
"The first two sets were very bad. I had no rhythm and was hitting too many unforced errors," said Djokovic.
"Then I decided to go for my shots and try everything or nothing.
"He showed once again that he is very strong mentally. He's the best defensive player in the world and plays every point as if it's match point."
Nadal broke to lead 2-1 in the first set before the Serbian, who struggled with his serve in the cool, blustery conditions, started to try and mix up his game, throwing in drop shots amidst lengthy, punishing rallies.
But always Nadal found a devastating reply.
Djokovic, who had lost to Nadal here in the previous two years, picked up a code violation in the 10th game for launching the ball into the upper reaches of the Court
I FROM PAGE 17
Philippe Chatrier in a sign of utter frustration.
Nadal was also ticked off for a time violation but it didn't prevent him from taking the first set.
The champion then broke in the first game of the second set and fought off a break point against him in the fourth to lead 3-1
That became 4-1 as Djokovic, run ragged by Nadal’s all-court mastery, was broken to love and
I then 5-1 courtesy of another domi-
nant service game.
With the second set wrapped up, Nadal then stormed into a 3-0 lead in the third.
But Djokovic held on, squaring the set in the 10th game when Nadal was serving for the match and even carved out a set point In the 12th game before the champion rallied to ensure the tiebreak.
That was as good as it got for Djokovic as Nadal romped away with the breaker and into another Roland Garros final.