& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Pakistan make it 2-0

AFP, Faisalabad
Pakistan relied on an entertaining half-century by Salman Butt to beat Bangladesh by seven wickets on Duckworth-Lewis method in a rain-hit second day-night international on Friday.
The left-handed opener cracked a 72-ball 76 to help Pakistan reach 160-3 with 10 balls to spare, chasing a revised target of 158 in 25 overs after two hours play was lost due to rain which soaked the ground at Iqbal Stadium.
The hosts now lead the five-match series 2-0. The third match will be played in Lahore on Sunday.
Bangladesh owed their total to a chancy 60 by Tamim Iqbal and a career-best unbeaten 58 by Mahmudullah Riyad when rain curtailed their innings to 225-8 in 48.2 overs.
The 23-year-old Butt went on a rampage right from the outset, hitting a brisk 46 for the opening wicket with Nasir Jamshed (21) and added a further 73 for the third wicket with Mohammad Yousuf who made 32 not out.
Butt and Yousuf ensured Pakistan did not waste a good start after they lost Jamshed and Younis Khan (13) in quicksuccession.
Butt hit nine boundaries and a six before he was run out with just seven needed to win.
Yousuf, when 19, also completed 9,000 one-day runs. He is only the second Pakistani batsmen behind now retired Inzamamul Haq (11,739 in 378 matches) to achieve the feat
Earlier, Bangladesh's innings was propped up by Mahmudullah who hit six boundaries during his 74-ball knock. He beat his previous highest score of 49 not out made against Ireland at Dhaka last month.
Mahmudullah shared a 75-run seventh wicket stand with Dhiman Ghosh (27) after the tourists were restrictedto 141-6inthe34thover.
Bangladesh, who elected to bat after winning the toss, lost opener Shahriar Nafees (four) to Sohail Tanveer before Umar Gul picked his 50th wicket in one-day internationals when he trapped Aftab Ahmed leg- before for one.
Ashraful (32} opened his scoring with a boundary off Gul to overhaul Habibul Bashar's 2,168 runs in 111 matches -- the most runs by a Bangladeshi batsmen in one-day internationals.
Ashraful, who now has 2,188 runs, took four matches more than Bashar's 111.
He hit three boundaries in one Gul over before he was trapped leg-before by Rao Iftikhar in the 16th over.
It was Iqbal, dropped on 20 off Gul by Jamshed at square-leg, who lifted the tempo by hitting the unlucky bowler for two boundaries to reach his fifth one-day 50 off 69 deliveries.
His fighting knock came to an end when he holed out to Afridi at long-off where Gul took a head high catch. He hit 10 boundaries during a 78-ball knock.
Ferhad Reza hit two boundaries and a six in his brisk 34-ball 26 before Mahmudullah and Ghosh helped the tourists across the 200-mark.
Leg-spinner Shahid Afridi picked 3-33 while Tanveer and Rao Iftikhar grabbed two wickets apiece.
SCOREBOARD
Scoreboard of the second one-day international between Bangladesh and Pakistan at the Iqbal Stadium in Faisalabad on Friday: BANGLADESH
Iqbal c Gul b Afridi 60
Nafees c Akmal bTanveer 4
Aftab lbw b Gul 1
Ashraful lbw b Iftikhar 22
Shakib lbw b Afridi 4
Mahmudullah not out 58
Reza lbw b Afridi 26
Dhiman c Jamshed b Iftikhar 27 Mortaza bTanveer 1
Razzaknotout 1
Extras: (lb-2,nb-5,w-14) 21
Total: (For 8 wkts in 48.2 overs)225 Did not bat: Syed Rasel.
Fall of wickets: 1-17, 2-31, 3-70, 4-89.5-104,6-141,7-216,8-223.
Bowler O M R W
Gul 7 1 51 1
Tanveer 9 0 36 2
Iftikhar 8.2 2 34 2
Afridi 10 0 33 3
Malik 10 1 45 0
Younis 4 0 24 0
PAKISTAN
Butt run out 76
Jamshed b Shakib 21
Younis Khan b Reza 13
Yousufnot out 32
Malik not out 4
Extras: (lb-8, w-6) 14
Total: (For3 wkts in 23.2 overs) 160 Did not bat; Misbahul, Afridi, Akmal, Tanvir, Gul, Anjum.
Fall of wickets 1-46,2-78,3-151.
Bowler O M R W
Mortaza 5 0 31 0
Basel 3 0 29 0
Bazzak 4.2 0 23 0
shakib 5 0 29 1
Bcza 4 0 22 1
Mahmudullah 2 0 18 0
Bcsult: Pakistan won by 7 wickets n D/L method.
Man-of-the-match Salman Butt.