& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Wenger blames referee

REUTERS, Liverpool
Arsene Wenger blamed the referee and his own defence for Arsenal's 4-2 defeat in an astonishing Champions League quarterfinal at Liverpool onTuesday.
The Gunners were seven minutes away from advancing to the semifinals on the away goals rule after making the score 2-2 on the night, but went out 5-3 on aggregate after two late Liverpool goals.
A controversial penalty award by Swedish referee Peter Frojdfeldt for a tug on Ryan Babel by Kolo Toure saw Steven Gerrard score the crucial goal to put Liverpool 3-2 ahead with five minutes to play.
To rub salt into Wenger's wounds, Arsenal had an identical appeal for a penalty dismissed in the first leg at the Emirates Stadium
last week when Liverpool held them to a 1 -1 draw in London.
"We have a feeling of disappointment and injustice. At the moment it is difficult because the whole dressing room is down," Wenger said.
"The game is over for us. It was down to a dodgy decision, I believe, from the referee. Over the two games it was difficult to swallow. It was a double disappointment because all the big decisions went against us.
"We have to live with that. Sometimes you have to swallow the unswallowable. It is difficult to understand for me. It was never a penalty. I have watched it clearly again, but last week it was definitely a penalty."
Wenger felt his defence played a part in Arsenal's downfall as Sami Hyypia was allowed a free header to equalise Abou Diaby’s opener and Fernando Torres found time to turn and score his side's second. After
Gerrard's penalty, Babel completed the scoring with a stoppage-time fourth.
"We had so much control but we were naive and we lacked a bit defensively," Wenger added.
"The defeat was not down to mental strength though, it was down to a lack of experience defensively. We made big mistakes and we conceded a goal from a comer and on the second goal we gave Fernando Torres too much room."
Arsenal have now won just two of their last 12 games and only have the Premier League title to chase. They are six points behind leaders Manchester United with five games to play.
Wenger believes a series of poor decisions and injuries to key players have affected his side.
’The team is sick We feel everything is going against us. We lacked that extra bit of confidence because week after week there is more disappointment," he grumbled.