& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Tim & Paul's rescue act
FROM PAGE 17
On the second ball after lunch the momentum changed when allrounder Jacob Oram bowled Vaughan for 32 and in his next over had Cook caught behind by Brendon McCullum for 44.
Kyle Mills chimed in with the wicket of Andrew Strauss for eight when he directed the ball straight to Mathew Sinclair at point and in the first nine overs after lunch England had lost three wickets for only 15 runs.
Mills was also unlucky not to get Ian Bell first ball when he sent a top edge to midwicket where Mark Gillespie completely misjudged the flight of the ball and spiffed the catch.
Bell had a second life when he was dropped by McCullum and he crawled to 11 off 38 balls before McCullum made no mistake with the next edge and held a catch diving to his right off Chris Martin.
Gillespie also made amends for his dropped catch when he bowled Kevin Pietersen for 26 as the England dangerman played all around a full-length delivery and
England had lost five wickets for 57 runs.
It was the removal of Pietersen that saw the arrival of wicketkeeper Ambrose, who had displayed his tenacity and strokemaking ability when he posted 55 in England's first innings ofthe firstTest.
Oram was the most impressive of the bowlers and finished the day with two for 25 off 22 overs.
Chris Martin, Kyle Mills and Mark Gillespie also claimed a wicket.
Banking on the pitch favouring the pace bowlers New Zealand made one change to their winning combination from the first Test with seamer Gillespie coming in at the expense of the off-spinner Jeetan Patel.
England have made two changes to their first Test line up with the under-performing Matthew Hoggard and Steve Harmison replaced by Stuart Broad and James Anderson.
SCOREBOARD
Scoreboard at stumps on the first day of the second Test between New Zealand and England at the
Basin Reserve in Wellington on
Thursday:
ENGLAND: First innings
Cooke McCullum b Oram 44
Vaughan b Oram 32
Strauss c Sinclair b Mills 8
Pietbrsenb Gillespie 31
Belle McCullum b Martin 11
Collingwood not out 48
Ambrose not out 97
Extras: (b-5,lb-7,nb-8) 20
Total: (For5wkts in 90 overs) 291
Fall of wickets: 1-79, 2-82, 3-94, 4-126,5-136
To bat: Broad, Sidebottom, Anderson, Panesar
Bowler O M R W
Martin 19 1 76 1
Mills 24 2 77 1
Gillespie 17 1 70 1
Oram 22 10 25 2
Vettori 8 0 31 0
NEW ZEALAND: How, Bell,
Fleming, Taylor, Sinclair, Oram, McCullum, Vettori, Gillespie, Mills, Martin.
Toss: New Zealand.
Umpires: Steve Davis and Rudi Koertzen.