& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Lankans blown away
FROM PAGE 17
late in the innings, making a stylish 57.
SCOREBOARD
Scoreboard of the 11th one-day international of the Commonwealth Bank Series between India and Sri Lanka at the Bellerive Oval in Hobart on Tuesday: SRI I ANKA
Perera b Sharma 8
Jayasuriya c Dhoni b Pathan 34 Sangakkara c Dhoni b Kumar 33 Jayawardene c Sharma b Kumar 3 Silva d Dhoni b Kumar 0
Dilshan lbw b Sharma 8
Kapugederac and b Harbhajan 57 VaascGambhirb Sharma 0
MalingacUthappab Sharma 12
Muralidaran b Kumar 13
Amarasinghe not out 0
Extras: (Ib-5, w-6) 11
Total: (All out in 47.1 overs) 179
Fall of wickets: 1-15, 2-72, 3-77, 4-81,5-81,6-93,7-93,8-139,9-179 Bowler O M R W
Patel 9 0 51 0
Sharma 10 0 41 4
Pathan 10 2 23 1
Kumar 10 2 31 4
Harbhajan 4.1 0 17 1
Yuvraj 4 0 11 0
INDIA
UthappacAmerasinghebMalinga 11
Tendulkar c Silva b Muralidaran 63
Gambhir notout 63
Yuvraj c Dilshan b Perera 36
Shanna not out 3
Extras: (w-4) 4
Total: (For 3 wkts in 32.2 overs) 180 Fall of wickets: 1-18,2-120,3-171 Did not bat: Kumar, Pathan, Dhoni, Harbhajan, Sharma, Patel
Bowler O M W R
Vaas 6 0 29 0
Malinga 6 0 36 1
Amerasinghe 7 0 40 0
Muralidaran 8.2 0 54 1
Jayasuriya 10 4 0
Perera 4 0 17 1
Result: India won by seven wickets.
Man-of-the-match: Pravecn Kumar.
Toss: India.
Umpires: Rudi Koertzen and SimonTaufeL