& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Trio start year well

AFP,London
It was a case of as you were at the head of die Premier League as the top three sides all enjoyed a winning start to 2008.
Leaders Arsenal remained two points in front with a2-0 New Year's Day victory over West Ham at the Emirates Stadium.
Elsewhere on Tuesday, reigning champions Manchester United .stayed hot onArsenal's heels after a 1-0 success at home to Birmingham City.
Chelsea cemented their grip on third position by coming from behind to win 2-1 at Craven Cottage as Roy Hodgson's first match as manager of relegation candidates Fulham ended in a west London derby defeat
Liverpool, who headed into the New Year in fourth place, are at home to Wigan onWednesday.
Portsmouth, who in September defeated Reading in an 11-goal spectacular, won 2-0 in a match where the Royals played most of thegamewith lOmen.
Everton beat Middlesbrough by the same scoreline and in the day's late kick-off Aston Villa defeated Tottenham 2-1 at Villa Park.
Arsenal were ahead as early as the second minute at the Emirates Stadium when Eduardo scored his third goal in two league matches.
And the Gunners were 2-0 up in the 18th minute when Gael Clichy's long pass released Emmanuel Adebayor.
"It was quite comfortable in the end because we did the job early and controlled the game," said Arsenal manager Arsene Wenger.
Carlos Tevez broke the deadlock at Old Trafford in the 25th minute when he made no mistake after .being played in by Cristiano Ronaldo's cheeky backheel.
But worryingly for United, Tevez had to be helped into the dressing room at full-time with an ankle problem after being on the receiving end of a strong first-half challenge.
"He is doubtful for Saturday now (when United play Villa in the FA Cup)," said United manager Sir Alex Ferguson.
Reflecting on the match, the Scot was unhappy with United's display and the lack of support from the Old Trafford faithful.
"We were very careless in our finishing and when that happens you leave the door open."
Ferguson added. "It was a funny game because the atmosphere in the ground wasn't very good either.
I thought it was dead. We needed them (the crowd) to lift us a little bit. We didn't get that today."
Fulham gave Hodgson, a replacement for the sacked Lawrie Sanchez, an early boost through Danny Murphy's 10th minute penalty after Moritz Volz was seemingly clipped in the box by Joe Cole.
But the Cottagers have had a problem hanging onto a lead this term and Chelsea were level in die 54th minute when Alex's flick-on was headed in by Salomon Kalou.
Minutes later Chelsea went ahead when Germany's Michael Ballack, the captain of an injury-hit side, scored from the penalty spot after his shirt had been tugged by Clint Dempsey.
Fulham stayed second-bottom with just Derby County below them.
"I thought the attitude and desire of the players was very good," said an upbeat Hodgson.
However, he added: "If there are players available in the transfer window that we think would make us better then we would be interested."
Reading were a man down in the third minute at the Madejski Stadium after Ibrahima Sonko was red-carded for a foul in the box on Portsmouth striker Benjani Mwaruwari.
But from the resulting penalty
Pompey, who beat Reading 7-4 at Fratton Park, saw Croatia midfielder Niko Kranjcar hit the post.
However, they went ahead in the ninth minute when Sol Campbell scored from close ranger after Reading goalkeeper Marcus Hahnemann dropped Sulley Muntari's free-kick and Pompey's Papa Bouba Diop headed on.
John Utaka put the match beyond Reading in the 66th minute.
Everton struck twice towards the end of the second-half at the Riverside, Andrew Johnson netting in the 67th minute before Scotland's James McFadden doubled the lead five minutes later.
Villa took the lead through Olof Mellberg four minutes before halftime when the Sweden defender headed in an Ashley Young free-kick.
England striker Jermain Defoe equalised with a hooked finish in the 79th minute but Villa, again exposing Spurs's problems at setpieces, responded when Martin Laursen, left free at a corner, headed home five minutes from full-time.
"We've had some tough games recently and I thought our own energy might drop but we have a fantastic desire in the side," said Villa manager Martin O'Neill.
FROM PAGE 20
"No one epitomises that better than Martin Laursen. He was incredible, absolutely incredible...his whole performance was top-drawer."
Newcastle will try to ease the pressure on manager Sam Allardyce at home to Manchester City on Wednesday when Derby are away to Bolton. County's fellow relegation candidates Sunderland travel to Blackburn Rovers.