& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Jose-Arsene feud on

Chelsea close door on gunners

AFP, London
Jose Mourinho reignited his feud with Arsene Wenger on Sunday by claiming Arsenal's players had deliberately attempted to get Chelsea's Michael Essien sent off at Highbury.
Essien appeared fortunate not to receive a straight red card after catching Arsenal full-back Lauren with an elbow in the first half of the match that Chelsea won 2-0 to retain a nine-point lead over Manchester United at the top of the Premiership table.
But Mourinho insisted that Arsenal's players had over-reacted to the incident in an attempt to capitalise on the notoriety Essien earned with a horrific lunge at Liverpool's Dietmar Hamann during a Champions League clash earlier this month.
Asked what he had seen from the dugout as Lauren went to ground, Mourinho replied: "I saw ten players jumping on one. It looked like a strategy, like they were going to use the image Essien has at this moment and in the first body-to-body situation we have to jump on him.
"It is very, very sad, ten players jumping on one."
Wenger, who threatened to sue Mourinho earlier this year after being branded a "voyeur" by his Chelsea counterpart, scoffed at the claim.
"Essien was a straight red in my opinion -- it was just in front of the dugout. The ref was not brave enough to make the decision but it was a straight red. He did not play the ball he played the player.
"We did not even speak about this before the game. If it was a deliberate strategy, we hid it very well."
The Arsenal manager had said before the game that he would be prepared to shake Mourinho's hand. He did not get the chance however as the Chelsea manager raced straight down the tunnel on the final whistle, although the missed opportunity for a reconciliation did not trouble Wenger.
"I must say that frankly that does not stop me from sleeping," he said.
Wenger was more aggrieved over a disallowed goal from Robin van Persie that would have given his
side the lead mid-way through the first half. Television replays showed that van Persie was onside when Freddie Ljungberg's pass found him.
"Eighty-five percent of these type of games are decided on the first goal, so we feel that the referee made a very bad decision," Wenger said.
Wenger conceded that his side, now languishing in eighth place and 20 points behind the leaders, had left themselves with too much to do.
The match itself was marked with drama and controversy. Dutchman Robben broke a bad-tempered deadlock in the 39th minute when striker Didier Drogba put him through just over the halfway line.
The speedy winger kept his head to angle a left-footed shot past Jens Lehmann from 10 metres, the ball hitting the far post before bouncing in.
Cole made it two in the 73rd minute with another fine individual effort to win the ball from Lauren on the right, cut inside and outflank England teammate Sol Campbell before poking the ball home.