& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

SERIE A

Milan run snapped

Afp, Rome
Carlo Ancelotti was furious after his AC Milan side had a goal controversially ruled out in their 3-1 defeat at Fiorentina which brought to an end their eight-match winning streak.
With four minutes remaining and Fiorentina leading 2-1, Alberto Gilardino shrugged off the attention of Marco Di Loreto to head home Manuel Rui Costa's right-wing cross.
But the linesman ruled that Gilardino had fouled Di Loreto before diving low to send the ball past
Sebastian Frey.
Insult was added to injury seconds later when Luca Toni scored his second goal of the game to wrap up Fiorentina's fifth successive victory which drew them level with Milan on 28 points, five behind leaders Juventus who beat Roma 4-1 on Saturday.
Milan's defence were caught napping in the 10th minute when Toni ghosted in unmarked to head home Manuel Pasqual's crossed free-kick.
But Milan drew level 15 minutes later when Serginho's cross found Gilardino whose flicked header eluded Frey's reach.
Fiorentina regained the upper hand within 60 seconds of the restart when
Martin Jorgensen capitalised on Alessandro Nesta's error before Toni's stooping header put the result beyond doubt.
Inter Milan are 10 points off the pace in fourth spot after beating struggling Parma 2-0 at the San Siro where Luis Figo scored his first goal for the club since arriving from Real Madrid in the summer.
Livorno climbed to fifth courtesy of a 2-0 home victory against Tuscan rivals Empoli and Lecce moved off the bottom with a 3-0 home win over Siena.
Cagliari dropped to the foot of the table after losing 3-1 at Reggina, while two goals in one second-half minute handed Sampdoria a 2-0 win at home to Lazio.
Treviso threw away an early two-goal lead to draw 2-2 at home to Palermo and Chievo were held 1-1 by Ascoli.
HOPESIM
Italian football league table after Sunday's matches (played, won, drawn, lost, goals for, goals against, points):
Juventus 12 11 0 1 26 6 33
AC Milan 12 9 1 2 27 12 28
Fiorentina 12 9 1 2 27 13 28
Inter Milan 12 7 2 3 22 10 23
Livorno 12 6 3 3 13 13 21
Sampdoria 12 6 2 4 23 17 20