& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Blatter threatens Turkey after tunnel bust-up

AFP, Geneva
FIFA president Sepp Blatter has threatened to come down hard over the trouble which blew up after Switzerland knocked Turkey out of the 2006 World Cup on Wednesday.
"I can tell you this, not as a Swiss, but as the president of FIFA that we will act here and we will act tough," Blatter told a news conference.
FIFA will decide on sanctions before the 2006 World Cup draw on December 9.
Penalties could range from a warning to a ban for individual players or countries.
Earlier in the day Blatter had threatened to ban Turkey from the qualifying competition for the 2010 World Cup in South Africa.
Switzerland lost a dramatic second leg 4-2 in Istanbul on Wednesday but advanced to 2006's finals thanks to the away goals rule.
Swiss players left the pitch under a hail of objects thrown by the crowd
and players from both sides clashed in the tunnel.
Reports said Swiss defender Stephane Grichting was taken to hospital with a perforated urinary tract.
Switzerland coach Kobi Kuhn was also hit by coins and press officer Pierre Benoit said the incidents would be reported.
Tuncay Sanli scored a hat-trick for the Turks, who finished third in the 2002 World Cup, but Marco Streller's 84th minute goal put the Swiss through.
However, the match ended with tempers frayed and television footage showed Swiss player Benjamin Huggel kick a member of the Turkish coaching staff as he ran off the pitch.
Then former Aston Villa defender Alpay aimed a kick at Streller as the goalscorer went down the tunnel towards the dressing rooms and the trouble erupted.
According to reports, Grichting was taken to Istanbul's Acidem Hospital after being kicked in the groin.
However, TRT television reported that he was in good condition and the
Istanbul hospital told AFP they had treated no one by that name. The Turkish media blamed Huggel's kick for sparking the trouble.
And Turkey striker Halil Altintop, with German team Kaiserslautern, played down the clashes.
"A few of our players overreacted after the match but I am happy there were no serious incidents," he said.
"I was in the Swiss locker room and talked to the players I knew from the Bundesliga. They said everything was fine."
The Swiss bus had been pelted with eggs when they flew in on Monday and the Swiss national anthem was whistled during Wednesday's pre-match ceremony -as the Turkish anthem had been in Bern.
Violence is not rare in football-mad Turkey.
But the 43,000 fans at the Sukru Saracoglu stadium in Istanbul were relatively well-behaved after appeals by cabinet ministers for calm.
The worst case of violence came in 2000 when two English fans were stabbed to death before a UEFA Cup match between Galatasaray and Leeds United.