& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

2 die after falling into Mirpur well

14 workers hurt as market roof collapses

STAFF CORRESPONDENT
Two workers died in Pallabi as they fell into an abandoned well while at least 14 workers were injured in a separate incident as the roof of an underconstruction building in Malibagh collapsed yesterday morning.
Witnesses said three residents of Begun Tila slum in Pallabi fell down the 150-feet deep well while repairing a
tube-well inside it at around 11:00am.
Local people informed the incident to police.
Later, fire brigade divers retrieved the dead bodies of Shafiq, 30, and Hashem, 25. Police sent the bodies to the Dhaka Medical College and Hospital for autopsy.
The other person Badal, 18, was rescued unconscious from the well
and rushed to a local hospital, police and witnesses said.
In the other incident, the roof of the under-construction building of Fortune Shopping Mall opposite the Mouchak Market in Malibagh collapsed yesterday morning.
Witnesses said the accident occurred at around 10:35am when the workers were carpeting a section of the roof on level 10 of the building.
The roof collapsed due to flawed construction, partially damaging three shops close to the construction site.
The engineers responsible for monitoring the construction work were not present at the site when the accident took place, the sources said.
Md Hannan, an employee of the construction firm Globe Engineering, told The Daily Star that the company was investigating the reason behind the collapse.
Of the injured workers, seven were identified as Saidul, Zahid, Anwar, Yatimuddin, Tofael, Arif and Saiful.
The condition of Saiful was stated to be critical.
Three years ago, a part of the adjoining footpath collapsed as a big landslide occurred during the piling work of the underground foundation of the same building, sources said.
Fire brigade and police visited the spot.