& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Warne walks on thin line

SMH, Edgbaston
Cricket
Shane Warne had his bowling hammered by England's batsmen on Thursday, and must now hope the umpires in the second Test at Edgbaston are not as unforgiving.
Warne again trod a fine line between expressing his anguish and being booked for dissent after having several close leg before appeals turned down by umpire Billy Bowden on Day One.
Test cricket's leading wickettaker threw his arms in the air after one appeal was rejected, and at one stage pumped both fists when a bat pad appeal against Ashley Giles was given not out.
Warne's frustrations mirrored his disappointment during the first Test at Lord's, when umpire Aleem Dar turned down a series of lbw appeals against England openers Marcus Trescothick and Andrew Strauss.
A Cricket Australia spokesman
said no dissent reports had been lodged at Edgbaston after the opening day, but under International Cricket Council guidelines umpires have until after the match to do so.
Unlike the first Test, England's batsmen decided attack was the best form of defence against their nemesis.
Strauss whacked Warne over his head for four during the bowler's first over, and Andrew Flintoff later took a liking to his bowling by belting him for three sixes.
Warne was left with no option than to good-naturedly doff his hat when the raucous Edgbaston crowd roared with delight at the concession of the 100th run off his bowling.
Three late wickets gave Warne figures of 4-116, and a career total of 593 scalps. Having taken 102 of those since he returned to Test cricket from a 12-month drug ban, in March last year, Warne is now poised to reach 100 wickets on English soil.
As part of their preparations for facing Warne, England's batsmen have spent time in the nets against a
high-tech bowling machine -- nicknamed Merlin -- which is capable of spitting out balls that loop and turn like a Warne leg break.
However Flintoff, who hit five sixes in total in his 68, said a lot of the difference in his turnaround from Lord's, where he made a duck and three, was in the mind.
"I've not scored too many runs of late and in the past week since the Lord's Test match, I've been working hard on my technique and also on areas in which I'm going to score in," the England allrounder said.
"So I went in there in a positive mindset, just trying to hit the balls which I could hit. It wasn't reckless, it was just trying to hit in my areas."
Australian paceman Michael Kasprowicz, who took 3-80 after getting a late call-up to replace McGrath, said Australia was not surprised by England's decision to attack.
"When a team loses and they're going to go out and play the same team the next week, you're going to change a few things," he said.