& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Pakistanis in grim search for missing relatives

AFP, Ghotki
Relatives desperately sought news of their loved ones yesterday as medical workers struggled to identify mangled corpses a day after around 150 people died in Pakistan's worst train crash in 15 years.
Stations across the country have been thronged with people frantically searching victim lists posted by the authorities after the three-train pile-up early Wednesday near the southern town of Ghotki.
Thousands of others travelling in buses, trains and trucks flocked to hospitals near the crash site, where for some, severed body parts held the answer they had been dreading.
"I can recognise his feet and hands," said sobbing Allah Ditta, who came to Ghotki hospital from Bhawalpur, a town in central Punjab province, to search for his missing brother.
A senior rail official told AFP Wednesday that 150 people had died, while doctors at the hospital said 164 people were killed. A Pakistan railways press release would only confirm 138 deaths.
Officials said they were trying to identify nearly 100 unclaimed bodies, which lay shrouded by white sheets in the courtyard of the small government hospital nearly 36 hours after the collision.
Ice-blocks and fans were used to cool the bodies because of the lack
of a nearby mortuary.
"We have so far handed 37 bodies to their relatives but 96 bodies are still lying at the hospital as their identification has not yet been established," railway police officer Shafi Mohammad Mughal told AFP.
"We are trying our best to find the family members so they can be laid to rest," he said. Muslim funerals are supposed to be held as soon as possible after the person's death and usually take place within one day.
"Most of the unclaimed bodies do not have faces and heads and we have gathered hands, feet and torsos," said Amanullah, a volunteer from the private Edhi Welfare Trust, Pakistan's largest charity.
The accident happened when one of the trains, the Quetta Express, stopped for repairs at Sarhad station, seven kilometres (four miles) from Ghotki, and the Karachi Express coming from Lahore smashed into it in the early hours.
A number of carriages were catapulted onto a parallel track and a third train, the Tez Gam Express heading for Islamabad's twin city Rawalpindi, then careered into them.
Rail chiefs Wednesday blamed the driver of the Karachi Express, who died in the crash, saying he misread a green signal meant for the stationary train.