& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Greece melt in Samba heat

REUTERS, Leipzig
World champions Brazil scored an emphatic 3-0 win over European champions
Greece on Thursday, with a stunning goal by Adriano the highlight of their opening Group B Confederations Cup match.
The striker's inswinging left-foot shot from 30 metres embarrassed Greek goalkeeper Antonios Nikopolidis as it flew past him at his near post after 41 minutes.
But while Adriano grabbed some of the spotlight, Robinho gave further evidence he is on his way to becoming Brazil's next great player with a superb solo performance, capped by their second goal and the
Man of the Match award.
The 21-year-old Santos striker, coveted by many of Europe's richest clubs, scored in the 46th minute after Gilberto surged through the Greek defence unchallenged before crossing for him to steer the ball home unmarked at the far post.
Substitute Juninho Pernam-bucano added Brazil's third in the 81st minute, just four minutes after replacing Kaka, firing home a superbly executed free-kick from 20 metres out.
Along with the award, Robinho's third goal in his eighth full international won the praise of coach Carlos Alberto Parreira.
"Robinho is a reality" he said. "He is a treasure for us. He has such skill, such personality, so much talent and he is so young.
"This was a big occasion for him playing a tough match against the European champions and he did very very well."
Brazil were the better team in a match that was evenly balanced for most of the first half, before opening up in the second as Greece were forced out of their shell.
"I was very pleased with the way we played, we were a real team today. We created plenty of chances and played very well defensively," Parreira said.
"It was a very good start to the competition for us. This is the Confederations Cup, not the World Cup, but it had the feeling of the World Cup about it."
Despite their typically robust defending, often with seven or eight men behind the ball, Brazil's superior technique told as the artistry of Ronaldinho, Robinho, Kaka and Adriano found increasingly large gaps in the Greek defence.
Greece could have gone ahead as early as the second minute, though, when the unmarked Sotirios Kyrgiakos wasted a clear header.
it was their last clearcut chance until first-half stoppage time when Angelos Haristeas swept the ball into the side netting with only Brazilian keeper Dida to beat.
Brazil missed a good chance after 1 7 minutes when Ronaldinho jinked his way past a defender to set up Robinho for a rasping shot which Nikopolidis saved superbly.
Kyrgiakos was a tower for Greece at the back and followed Adriano like a shadow all over the pitch, but was powerless to stop him scoring four minutes before the break.
Kyrgiakos had only just returned to the field after being treated for a leg injury and for once allowed some daylight between himself and Adriano, who took full advantage.
Robinho could also have doubled Brazil's lead with the last kick of the first half when he
volleyed high and wide unmarked at the far post -although he made up for that seconds after the break with Brazil's second.
With the likes of Cafu, Roberto Carlos and Ronaldo all missing from this squad, parreira is testing younger players like right-back Cicinho and Robinho, who both acquitted themselves well.
Greece's German coach Otto Rehhagel, starting the match with eight of the players who won Euro 2004 a year ago, saw his team play with their usual gritty defensive strength.
But the Brazilian rearguard, helped by an outstanding Roque Junior, performed even better and in the end, there was only one team in it.
Rehhagel admitted: "it was a special feeling for us today, there were so many Greek fans here.
"it was just a shame it was not a more open match and i wish we could have put up more of a fight against them. i think we played better in the second half but it was against Brazil and it is always difficult against Brazil.
"You can't do much against a bomb like that from Adriano. You can't shut Brazil down for 90 minutes."