& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Davenport stuns Clijsters

AP, Paris
Lindsay Davenport dug out of another hole on clay Sunday, staging a comeback to beat Kim Clijsters at the French Open.
The top-ranked Davenport won 1-6, 7-5, 6-3 to reach the Roland Garros quarterfinals for the first time since 1999.
Veteran former winner Mary Pierce also reached the last eight although she needed 11 match points to end the challenge of Switzerland's Patty Schnyder.
The French top seed won a fluctuating match 6-1, 1-6, 6-4 to set up a quarterfinal meeting with top seed Davenport.
Joining the 28-year-old Davenport in the final eight was 15-year-
old Bulgarian Sesil Karatantcheva, who showed her earlier win over Venus Williams was no fluke by beating Emmanuelle Gagliardi 7-5, 6-3.
The youngster will next face No. 16-seeded Elena Likhovtseva, who needed 2 hours, 49 minutes to win an all-Russian matchup by beating No. 4 Elena Dementieva 7-6, 5-7, 75.
In men's fourth-round play, No. 10 David Nalbandian lost to unseeded Victor Hanescu 6-3, 4-6, 5-7, 6-1, 6-2.
No. 9 Guillermo Canas and No. 28 Nicolas Kiefer completed victories in third-round matches suspended Saturday because of darkness. Canas overcame two match points to edge Frenchman Paul-Henri Mathieu 6-3, 7-6, 2-6, 6-7, 8-6. Kiefer defeated Igor Andreev 6-4, 76, 3-6, 6-4.
Clijsters, seeded 14th but play-
ing the best tennis in the tournament through the early rounds, was three games from another easy victory but struggled with her serve and began to misfire from the baseline.
Clijsters committed 11 doublefaults, and the last one came on break point to put her behind 5-3 in the final set. Three errors by Clijsters in the final game gave the win to Davenport, who in a rare display of jubilation meekly raised a fist and smiled.
The tall American began thinking about giving Roland Garros another try just three weeks ago.
Starting on a mild, hazy morning, Clijsters whacked three winners in the opening game, earned her first service break with a running forehand winner and swept the final five games of the first set. Not even three double-faults in the final game could keep her from serving out the set.