& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Afridi blazes Kanpur

Pakistan go in front

AFP, Kanpur
Shahid Afridi smashed the second-fastest one-day century off 45 deliveries as
Pakistan trounced India by five wickets on Friday to take an unassailable 3-2 lead in the six-match series.
The swashbuckling opener hit 10 boundaries and nine sixes in a brilliant 102 off 46 balls to help Pakistan overtake India's challenging 249-6 with 47 deliveries to spare at the Green Park here.
India must now win the final one-dayer in New Delhi on Sunday in front of Pakistan President Pervez Musharraf to draw the series.
Afridi, who holds the world record for the fastest one-day hundred off 37 balls against Sri Lanka in 1996, equalled the second-best effort of 45 deliveries by West Indian Brian Lara against Bangladesh in Dhaka
in 1999.
The 25-year-old fell one ball after reaching his fourth hundred when he was bowled by off-spinner Harbhajan Singh playing a rare defensive shot to the great relief of the awe-struck Indian fielders.
Fellow opener Salman Butt, enjoying a ringside view of Afridi's fireworks, contributed just 21 in a first-wicket stand of 131 which came off 14.2 overs.
Pakistan strolled comfortably after Afridi's dismissal, taking another 28 overs to get the remaining 119 runs for victory with Shoaib Malik making 41.
Rahul Dravid, leading India in Sourav Ganguly's absence, and his Pakistani counterpart Inzamam-ul Haq conceded Afridi made the difference.
"He played an absolutely brilliant knock," said Dravid, who himself top-scored in India's innings with 86.
"I thought 250 was a good score
SEE PAGE 13 COL 6 FROM PAGE 12
and if you take away Afridi's contribution it was not an easy target. He is a very dangerous player."
Inzamam said: "Afridi made the difference. Hope he continues like this in New Delhi as well because we have a good chance to win the series."
Afridi, the obvious choice for man-of-the-match, said the key to his success was positive thinking.
"I always go out there to play positive cricket," he said. "I did not score much in the first three games so I am glad I helped put my team in a winning position."
Pakistan raced to 55 in the first five overs, 43 off those runs coming off Afridi's blade in 15 deliveries with two sixes off Laxmipathy Balaji and three in one over off Anil Kumble.
Afridi, who had in the past twice scored half-centuries off 18 deliveries, needed 20 this time to reach his individual 50. When Pakistan posted 100 on the board, Afridi's own score was 75.
Fortune too appeared to favour the brave as Afridi was caught off a Dinesh Mongia no-ball when he reached 79.
Afridi's breathtaking strokeplay prompted an Indian spectator to display a signboard which read: "Afridi, please spare us for friendship's sake."
Afridi missed breaking his own world record of 11 sixes in a one-day innings he shares with Sanath
Jayasuriya of Sri Lanka.
Earlier, Dravid and Mohammad Kaif (78) helped India recover from early blows by Rana Naved to post 249-6 from 50 overs after electing to take first strike.
Naved removed the formidable opening pair of Sachin Tendulkar and Virender Sehwag in his first three overs and dismissed Mahendra Dhoni in the fourth as India slipped to 26-3 after electing to bat on the slow wicket.
Dravid and Kaif put on 135 for the fifth wicket and Mongia, who came in for Ganguly, made an unbeaten 33 off 28 balls.
India took the field without Ganguly even though he was eligible to play after appealing the six-match ban imposed on him by the International Cricket Council (ICC) for slow over-rates during the previous two matches in Jamshedpur and Ahmedabad.
SCOREBOARD
Scoreboard of the fifth one-day international between India and Pakistan at the Green Park in Kanpur on Friday:
INDIA
Sehwag b Naved 5
Tendulkar c Akmal b Naved 1
Dhoni c Younis b Naved 11
Dravid run out 86
Yuvraj b Razzaq 18
Kaif c Hafeez b Razzaq 78
Mongia not out 33
Zaheer not out 1
Extras: (lb-10, nb-4, w-2) 16
Total: (For six wkts in 50 overs)249 Fall of wkts: 1-10, 2-11, 3-26, 4-59, 5-194, 6-248.
Bowler O M R W
Naved 10 2 35 3
Iftikhar 10 1 46 0
Razzaq 10 1 51 2
Arshad 9 1 41 0
Afridi 6 0 32 0
Malik 5 0 34 0
PAKISTAN
Butt lbw b Kumble 21
Afridi b Harbhajan 102
Malik c Zaheer b Tendulkar 41
Youhana c Kaif b Kumble 24
Inzamam not out 24
Younis b Sehwag 24
Razzaq not out 0
Extras: (lb-5, nb-5, w-6) 16
Total: (For five wkts in 42.1 overs) 252 Fall of wkts: 1-131, 2-135, 3-193, 4216, 5-248.
Bowler O M R W
Balaji 6 0 51 0
Zaheer 7 1 35 0
Kumble 10 1 54 2
Mongia 4.1 0 40 0
Harbhajan 10 0 43 1
Tendulkar 3 0 20 1
Sehwag 2 0 4 1
Result: Pakistan won by five
wickets, lead six-match series 32.
Man-of-the-match: Shahid Afridi. Final match in New Delhi on Sunday.