& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Australia lbw NZ
while Ponting belted seven fours and a six to finish 47 not out.
Australia vice-captain Adam Gilchrist was named man-of-the-match after his 121 in the first innings changed the course of the Test.
The tourists were in trouble at 201 for six when Gilchrist strode to the crease but finished one run behind New Zealand's first innings after he and Simon Katich (118) added 212 for the seventh wicket.
SCOREBOARD
Final scoreboard on the fourth day of the first Test between New Zealand and Australia at Jade Stadium in Christchurch on Sunday: NEW ZEALAND: First innings 433 (Marshall 146, Cumming 74, Astle 74; McGrath 6-115, Warne 2-112)
AUSTRALIA: First innings 432
(Gilchrist 121, Katich 118; Vettori 5106)
NEW ZEALAND: Second innings (overnight 9-0)
Cumming lbw b Gillespie 7
Fleming lbw b McGrath 17
Marshall b Warne 22
Vincent lbw b Gillespie 4
Astle b Kasprowicz 21
McMillan c Katich b Warne 5
McCullum lbw b Gillespie 24
Vettori lbw b Warne 23
Franklin not out 5
O'Brien lbw b Warne 0
Martin lbw b Warne 0
Extras: (b-1, lb-1, nb-1) 3
Total: (All out in 50 overs) 131
Fall of wickets: 1-20, 2-30, 3-34, 471, 5-78, 6-87, 7-121, 8-127, 9-131 Bowler O M R W
McGrath 14 7 19 1