& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

5TH BD-ZIM ODI
Scoreboard of the fifth and final CityCell one-day international between Bangladesh and Zimbabwe at the Bangabandhu National Stadium on Monday:
ZIMBABWE
Matsikenyeri lbwb Nazmul 5
Rogers st Mashud b Enamul 84
Masakadzacand bManzarul 23
Taylor lbw b Rafique 36
TaibubMashrafee 31
Chigumburacand b Enamul 1
Sibanda lbwb Rafique 1
Nkalac Enamul b Nazmul 8
Panyangararunout 1
Utseya run out 1
Mpofu notout 1
Extras: (lb-2, nb-1 ,w-3) 6
Total: (All out in 49 overs) 198
Fall of wickets: 1-12, 2-44, 3-139,4-161,5-165, 6-168, 7-184, 8-187, 9-191
Bowler O M R W
Mashrafee 9 1 42 1
Nazmul 9 1 51 2
Manzarul 10 2 21 1
Rafique 10 1 34 2
Enamul 10 0 39 2
Kapali 10 9 0
BANGLADESH
Rafique c Utseya b Chigumbura 72
Iqbal b Panyangara 9
Aftab notout 81