& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Primera Liga

Eto'o bails Barca out

REUTERS, Madrid
Barcelona striker Samuel Eto'o atoned Tor missing an early penalty by grabbing a late winner to give his side an agonising 1 -0 win over 10-man Real Sociedad at the Nou Camp on Sunday.
The Cameroon international fired in a difficult header after Mexican midfielder Rafael Marquez had flicked on a corner nine minutes from time, but If it had not been for some fantastic goalkeeping from Victor Valdes the Catalans would not have hung on for the win. '
Real Madrid also had to dig deep to come from a goal down to tvin 3-1 at home to 10-man Real
Zaragoza in Sunday's late match.
The results meant that Barcelona preserved their seven-point lead over Real in the standings at the half-way point in the season.
Barca have 45 points from 19 games, Real have 38 and Valencia, who were held to a 0-0 draw at Osasuna. are two behind on 36.
Valencia gave a subdued performance in a match overshadowed by the news of the sudden death of the young daughter of Valencia defender Marco Cancira shortly before the kickoff.
Zaragoza stunned the home fans at the Bernabeu when striker David Villa put them ahead with a brilliant virtuoso goal midway through the first half.
But Real equalised three min-
utes before the break when Raul scooped the ball over the keeper after Zinedine Zidane and Ronaldo had combined to slice open the Zaragoza defence.
Zaragoza suffered a double setback at the start of the second half, losing centre-back Alvaro after he picked up a needless second booking for a foul on the halfway line and then going 2-1 down when Ronaldo headed in at the far post after a Luis Figo shot fell into his path. It was the Brazilian superstar's llth goal in the campaign.
The visitors were left seething, however, because Figo had appeared to receive the ball in an offside position and they were then denied a penalty after defender Michel Salgado had
hauled Villa down in the area.
But they had nothing to complain when substitute Michael Owen completed the Real victory with a fine strike five minutes from time, the England striker threading a shot between two defenders, out of reach of the keeper and inside thefar post.
Barcelona, who suffered only their second defeat of the season when they went down at Villarreal last week, were gifted a great chance to take the lead when they were awarded a dubious penalty in the fourth minute after midfielder Andres Iniesta went down in the area.
But Eto'o fired his spot kick against the post and the Catalans, who were missing Influential Portugal midfielder Deco, grew increasingly frustrated as they were unable to break down the crowded Socicdad defence.
The Basque side sat back and defended for most of the first half but almost snatched the lead when striker Darko Kovacevic unleashed a viciously dipping shot from the edge of the area only to see it tipped over thebarby Valdes.
Sodedad’s attacking options were further reduced when midfielder Xabi Prieto was sent off after picking up a second card for hauling back Silvinhojustafterthehour.
Barca laid siege to the Sociedad area but only managed to break the deadlock when Eto'o headed in after Xavi's corner in the 8lst minute to take his tally for the season to 14.
I Spanish football league standings after I Sunday’s matches (played, won, drawn, I lost, goals for. goals against, points):
Barcelona 19 14 3 2 36 14 45
Real 19 12 2 5 32 14 38
Valencia 19 10 6 3 29 13 36
Espanyol 19 10 4 5 23 14 34
Sevilla 19 9 5 5 21 19 32
Beds 19 8 6 5 24 21 30