& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

BANGLADESH-NZ SCOREBOARD
Scoreboard of the third and final RC Cola one-day international between Bangladesh and New Zealand at the Bangabandhu National Stadium yesterday:
NEWZEALAND
Astle run out 27
Sinclair c&b Rafique 66
Harris lbwb Aftab 9
Marshall c Rajin b Rafique 0
StyriscKapalib Rafique 51
McMillan c&b Rafique 39
Cairns cRajinbTapash 34
Vcttorinotoul 18
Extras: (lb-3,w-3) 6
Total: (For 7 wickets in 50 overs) 250 Did not bat: James Franklin, McCullum and Mills.
Fall of wickets: 1-72, 2-99, 3-102, 4-105,5-191,6-207,7-250
Bowler O M R W
Thpash 5 0 35 1
Mushfiq 8 2 28 0
Manzural 9 0 46 0
Aftab 10 0 36 1
Rafique 10 0 63 4
Rajin 4 0 18 0
Kapali 4 0 21 0
BANGLADESH
Javed lbwb Franklin 8
Rafique lbwb Mills 21
Nafeesc Sinclair bVettori 40
Rajin lbwb Styris 0
Ashrafulc Sinclair bVettori 13
Aftab c Harris bVettori 8
Mashud not out 40
Kapali b Cairns 17
Manzural not out 8
Extras: (Ib-4, w-4, nb-4) 12
Total: (For 7 wickets in 50 overs) 167 Did not bat Tapash Baisya and Mushfiqur Rahman.
Fall of wickets: 1-15,2-42,3-48,4-86, 5-96,6-109,7-138
Bowler O M R W
Mills 10 1 39 1
Franklin 9 2 29 1
Styris 10 1 31 1
Cairns 7 0 21 1
Vettori 10 0 25 3
Harris 4 0 18 0
Result New Zealand won the match by 83 runs and take the series 3-0.
Man-of-the-match: Matthew Sinclair
Player-of-the-series: Scott Styris Toss: New Zealand
Umpires: AFM Akhtaruddin (Bangladesh) and MR Benson (England).