& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

BANGLADESH-NZ SCOREBOARD
Scoreboard at stumps on the third day of the opening Test between Bangladesh and New Zealand at the Bangabandhu National Stadium in Dhaka on Thursday:
BANGLADESH: First innings 177 (Ashraful 67, Saleh 41, Mashud 23, Manzarul 16; Franklin 5-28, Oram 336, Vettori 2-36)
NEW ZEALAND: First innings (overnight 207-5)
Richardson c Mashud b Rafique15
Sinclair lbw b Rafique 76
Fleming c Mashud b Manzarul 29 Styris c Saleh b Manzarul 2
Astle c Manzarul b Rafique 11
Oram c Manzarul b Rafique 23
McCullum c Hannan b Rafique 143
Vettori c Iqbal b Manzarul 23
Franklin c Saleh b Baisya 23
Wiseman b Rafique 28
Butler not out 15
Extras: (nb-2, lb-5, w-4, b-3) 14
Total: (All out in 145.1 overs) 402 Fall of wickets: 1-34, 2-97, 3-99, 4122, 5-139, 6-223, 7-294, 8-351, 9371
Bowler O M R W
Baisya 28 4 112 1
Aziz 12 1 59 0
Rafique 59.1 18 122 6
Manzarul 42 12 84 3
Saleh 1 0 4 0
Kapali 2 0 6 0
Ashraful 1 0 7 0
BANGLADESH: Second innings Iqbal not out 24
Omar c McCullum b Vettori 14
Hannan c and b Vettori 1
Saleh not out 0
Extras: (b-1, nb-1) 2
Total: (For 2 wkts in 21 overs) 41 Fall of wickets: 1-27, 2-33
To bat: Ashraful, Kapali, Mashud, Manzarul, Rafique, Baisya, Aziz
Bowler O M R W
Oram 5 2 6 0
Franklin 5 1 14 0
Butler 4 1 8 0
Vettori 5 3 4 2
Wiseman 2 0 8 0