& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

BANGLADESH-NZ SCOREBOARD
Scoreboard at stumps on the second day of the opening Test between Bangladesh and New Zealand at the Bangabandhu National Stadium in Dhaka on Wednesday:
BANGLADESH: First innings
(overnight 165-6)
Hannan c Fleming b Oram 0
Omar b Franklin 1
Iqbal c McCullum b Oram 1
Saleh c Oram b Franklin 41
Ashraful c Astle b Vettori 67
Kapali c McCullum b Vettori 14
Mashud not out 23
Manzarul c McCullum b Franklin16
Rafique c Styris b Franklin 0
Baisya b Franklin 0
Aziz c Astle b Oram 0
Extras: (lb-7, nb-6, w-1) 14
Total: (All out in 98.5 overs) 177 Fall of wickets: 1-0, 2-5, 3-5, 4-120, 5-124, 6-136, 7-165, 8-165, 9-165
Bowler O M R W
Oram 22.5 9 36 3
Franklin 17 7 28 5
Styris 2 1 4 0
Butler 12 3 34 0
Vettori 29 15 26 2
Wiseman 16 5 42 0
NEW ZEALAND: First innings Richardson c Mashud b Rafique15
Sinclair lbw b Rafique 76
Fleming c Mashud b Manzarul 29 Styris c Saleh b Manzarul 2
Astle c Rana b Rafique 11
SEE PAGE 14 COL 1 FROM PAGE 13
Oram not out 18
McCullum not out 48
Extras: (lb-2, nb-2, w-4) 8
Total: (For 5 wkts in 79 overs) 207
Fall of wickets: 1-34, 2-97, 3-99, 4122, 5-139
To bat: Vettori, Butler, Franklin, Wiseman
Bowler O M R W
Baisya 13 2 45 0
Aziz 9 1 46 0
Rafique 33 13 50 3
Manzarul 21 4 54 2
Saleh 1 0 4 0
Kapali 2 0 6 0