& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Tendulkar drafted

AFP, Bangalore
Cricket
Star batsman Sachin Tendulkar was Friday named in a 15-member Indian squad for the opening two
Tests of a four-match series against Australia.
But Tendulkar, who missed three one-day tournaments because of an elbow injury, is still doubtful for the opening match starting here on
Wednesday.
"His fitness will be assessed on a day-to-day basis and his position ascertained before the first Test," the Indian cricket board secretary Karunakaran Nair said.
"Tendulkar was included in the team as we got a medical report that he is progressing well. Team physio Andrew Leipus has been looking after his rehabilitation process."
Tendulkar, who is suffering from an elbow injury, missed last month's Champions Trophy as well as a triseries in the Netherlands and three one-dayers in England.
The batsman, with 9,470 runs in 114 Tests, is just one century short of equalling compatriot Sunil Gavas-kar's world record of 34 hundreds.
A new selection committee headed by former India wicket-
keeper Kiran More did not spring any surprises.
Left-arm seamer Ashish Nehra was dropped on fitness.
"Nehra's name was discussed but the committee felt Zaheer Khan
and Ajit Agarkar were in a better position physically," said Nair.
Nehra withdrew from a practice match here earlier this week because of a swollen ankle. He was the second paceman to be ruled out after Laxmipathy Balaji, who is nursing an abdominal injury.
Zaheer Khan, who proved his fitness in recent domestic matches, returned to the squad after missing the ICC Champions Trophy in
FROM PAGE 13
England because of a leg injury.
Middle-order batsman Mohammad Kaif was picked ahead of Mumbai all-rounder Ramesh Powar, who was part of the Test squad that toured Pakistanin March this year.
Left-armer Murali Kartik was chosen as the third spinner behind Anil Kumble and Harbhajan Singh while the selectors decided to persist with wicketkeeper Parthiv Patel.
Australia have not won a Test series in India since 1969. Steve Waugh's team came close to clinching the series in 2001, but went down 2-1 after winning the first Test. SQUAD
Sourav Ganguly (capt), Rahul Dravid, Virender Sehwag, Akash Chopra, Venkatsai Laxman, Sachin Tendulkar, Yuvraj Singh, Mohammad Kaif, Anil Kumble, Harbhajan Singh, Parthiv Patel, Irfan Pathan, Zaheer Khan, Ajit Agarkar, Murali Kartik.