& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Premiership

Chelsea showing right signs

AFP, London
Jose Mourinho's Chelsea revolution finally seems to be gathering pace as his expensively-assembled side returned to the top of the Premiership table with a comfortable 2-0 victory over Crystal Palace at Selhurst Park.
The West Londoners secured their third successive league victory thanks to goals in either half from summer signings Didier Drogba and Tiago to leave Palace, newly promoted to the top flight of English football this season, rooted to the bottom of the table with only one point from three matches.
Mourinho had been accused of adopting a negative approach in his
first two games in charge, against Manchester United and Birmingham and, as if to answer those critics, the Portuguese coach made five changes to the side which scraped to victory at St Andrews on Saturday.
England international Joe Cole was rewarded for scoring the winning goal against Birmingham with a starting berth while Serbia and Montenegro star Mateja Kezman and Portugal's Euro 2004 hero Tiago were handed full debuts.
Chelsea were bristling with attacking intent, but it was Palace who made the brighter start. In the ninth minute, Wayne Routledge's teasing corner found Tony Popovic unmarked but the Australian could only send his header wide of the post.
However, as the match progressed, so Chelsea began to exert their class. A deft interchange of passes between Frank Lampard, Kezman and Cole in the 21st minute ended with the former West Ham man firing in a low shot that drew a fine stop from Palace goalkeeper Julian Speroni.
With Palace struggling to retain possession and Cole buzzing menacingly just behind the front two, it seemed only a matter of time before Chelsea would break the deadlock.
However, the simplicity of the goal, when it did come, will have infuriated Palace manager Iain Dowie.
After 28 minutes, Celestine Babayaro found himself with space down the left and his pinpoint cross picked out Drogba, who rose above Popovic and headed nonchalantly into the bottom corner.
It was a timely strike by Drogba,
who had failed to score since his 23 million pound move to Stamford Bridge from French giants Marseille and had been subjected to taunts of "what a waste of money" from the Palace fans in a near-capacity crowd.
However, it was Cole who provided the eye-catching performance. The 22-year-old was a constant threat and almost doubled Chelsea's lead 10 minutes before half-time when his vicous dipping volley from 25 yards forced Speroni to save.
Mourinho's side seemed set to consolidate their lead after the break but, although they dominated possession, they were shot-shy in front of goal. That reticence encouraged Palace who began to grow in confidence.
In the 50th minute striker Andy Johnson for once shook off the shackles of John Terry but his attempted lob drifted wide. Moments later, the former Birmingham player almost got his head to a Routledge cross which Chelsea keeper Petr Cech was grateful to gather.
But any hopes of a comeback were snuffed out when, after 70 minutes, Tiago turned Danny Granville and rifled in a ferocious shot which gave Speroni no chance