& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Under-19s call the shots

SPORTS REPORTER
Having lost the first two Tests and the series, Bangladesh U-19 cricketers hit back in the third and final Test against England when the junior Tigers shot out the home side for 185 in the first innings on the opening day at Glamorgan yesterday.
The tourists wiped out 58 of those runs at tea losing the wickets of Shahriar Nafees and Aftab Ahmed. Opener Nafees Iqbal was batting on 39 and Shamsur Rahman on 4.
England elected to bat first and lost Joe Denly for a duck when the opener was run out with just one run on board. England never recovered from that early damage as paceman Rubaiyat Haque picked two wickets to reduce England to 23-3.
Captain Alistair Cook tried to steady the innings with a 66-ball 36, but gave in to the Bangladesh spin duo -- Ashim Chowdhury and Nadif Chowdhury -who got on top to wrap up the England essay inside 50 overs.
Ashim went on to take 3-30 from 10.1 overs while Nadif and Rubaiyat also chipped in with a couple of wickets each.
Fiery paceman Shahadat Hossain, who joined the party late, was expensive and conceded 70 runs for his two wickets.
SCORECARD
Scorecard at tea on the first day of the third and final Test between Bangladesh Under-19 and England Under-19 at Cardiff yesterday: ENGLAND UNDER-19: First innings Cook lbw b Ashim 36
Denly run out 0
Ali c Mushfiq b Rubaiyat 8
Bopara c Mushfiq b Rubaiyat 0
Davies lbw b Nadif 6
Patel c Rubaiyat b Nadif 65
Smith b Ashim 1
Turner b Shahadat 13
Cusden b Shahadat 5
Griffiths c Aftab b Ashim 21
Munday not out 15
Extras: (b-1, lb-4, w-4, nb-6) 15
Total: (All out in 49.1 overs) 185
Fall of wkts: 1-0, 2-20, 3-25, 4-48, 5-56, 6-58, 7-97, 8-125, 9-153, 10-185.
Bowler O M R W
Shahadat 16 5 70 2
Rubaiyat 8 1 29 2
Nadif 15 6 51 2
Ashim 10.1 3 30 3
BANGLADESH UNDER-19: First innings
Nafees Iqbal not out 39
S Nafees c Cook b Cusden 8
Aftab Ahmed c Davies b Cusden 7 Shamsur Rahman not out 4
Extras: 0
Total: (For 2 wkts in 15 overs) 58
To bat: Dhiman Ghosh, Nazim-uddin, Nadif Chowdhury, Mush-fiqur Rahim, Rubaiyat Huq, Ashim Chowdhury, Shahadat Hossain.
Fall of wkts: 1-22, 2-52.
Bowler O M R W
Turner 7 1 22 0
Cusden 7 0 34 2
Griffiths 1 0 2 0
Toss: England Under-19.
Umpires: R Palmer and JF Steele