& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Key keeps hosts on course

AFP, Manchester
Robert Key's unbeaten 51 took England towards victory on the fifth day of the third Test against West Indies at Old Trafford here Monday.
At tea England were 146 for three, needing a further 85 runs in 44 overs - a run-rate of under two an over - to reach their victory target of 231.
Local hero was Andrew Flintoff was 22 not out following a session where England lost only one wicket, captain Michael Vaughan (33).
England inched their way to 56 for two at lunch and almost as soon as the players came off it rained.
But the weather relented during the interval and play resumed in bright sunshine with only eight overs lost.
Key was 19 not out and Vaughan unbeaten on six as England looked to go 3-0 up in the four-Test series and make
it nine wins from 10 Tests this year as well as six in a row.
SCOREBOARD
Scoreboard at tea on the fifth and final day of the third Test between England and West Indies at Old Trafford Monday:
WEST INDIES: First innings 395-9 declared (Bravo 77, Chanderpaul 76, Baugh 68; Hoggard 4-83, Flintoff 3-79) ENGLAND: First innings 330 (Thorpe 114, Strauss 90; Bravo 6-55)
WEST INDIES: Second innings (overnight 161-9)
Gayle c Hoggard b Giles 42
Joseph c Vaughan b Flintoff 15
Sarwan c Trescothick b Harmison 60
Lara c Strauss b Flintoff 7
Chanderpaul c Vaughan b Flintoff 2 Bravo c Flintoff b Giles 6
Baugh c sub b Harmison 3
Mohammed c Key b Giles 9
Collins b Harmison 8
Collymore not out 5
Edwards c Flintoff b Harmison 0
Extras: (b-2, lb-4, w-1, nb-1) 8
Total: (All out in 59.4 overs) 165
Fall of wickets: 1-41, 2-88, 3-95, 4-99, 5110, 6-121, 7-146, 8-152, 9-161
Bowler O M R W
Hoggard 7 0 21 0
Harmison 13.4 3 44 4
Flintoff 12 1 26 3
Giles 22 6 46 3
Anderson 5 1 22 0
ENGLAND: Second innings
Trescothick b Collymore 12
Strauss c Chanderpaul b Collins 12
Key not out 51
Vaughan c Lara b Gayle 33
Flintoff not out 22
Extras: (b-7, nb-9) 16
Total: (For 3 wkts in 49 overs) 146
Fall of wickets: 1-15, 2-27, 3-111
To bat: Jones, Thorpe, Giles, Hoggard, Harmison, Anderson
Bowler O M R W
Edwards 9 0 42 0
Collymore 13 7 18 1
Collins 6 2 13 1
Bravo 10 3 30 0
Mohammed 6 0 25 0
Gayle 5 0 11 1