& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

U-19 on the back foot

SPORTS REPORTER
Bangladesh U-19s were struggling to save the second Test against England as they slumped to 53-3 at tea on the third day at Taunton, Somerset yesterday.
Trailing England U-19s by 123 runs in the first innings, the young Tigers resumed third day's play at 13-1 shortly before the scheduled tea after the start was delayed because of rain.
Nafis Iqbal was the only man to be dismissed on Wednesday when he was caught behind for six.
During the 11 overs available before the break, Luke Wright sent back opener Shahriar Nafees and number four Dhiman Ghosh to reduce Bangladesh to 38-3.
Aftab Ahmed, who cracked four fours to score 21 off 44 balls, and his Chittagong pal Nazimuddin (4) were at the crease. Bangladesh need further 70 runs to wipe out the lead.
On the second day, paceman Nazmul Hossain, who has been called to the senior team for next month's ICC Champions Trophy along with Nafis Iqbal and Aftab, grabbed three quick wickets as England were all out for 396.
James Hildreth was the last man out after spearheading the hosts with a magnificent 210. Having hit 29 fours and six sixes from 255 balls, his five-hour essay ended when he was bowled by fast bowler Shahadat Hossain who took 3-58. His new ball partner Nazmul finished with 3-101.
Left-arm spinner Nadif Chowdhury took the remaining four wickets conceding 109 runs from 36 overs.
SCOREBOARD
Scoreboard at tea on the third day of the second Test between Bangladesh U-19s and England U-19s at Somerset yesterday:
BANGLADESH U-19S: First innings 273
ENGLAND UNDER-19S: First innings Cook c Aftab b Shahadat 23
Denly c Dhiman b Shahadat 16
Bopara b Nadif 28
Hildreth b Shahadat 210
Wright b Nadif 13
Patel c Shahriar b Nadif 1
Davies c Dhiman b Nazmul 71
Harrison b Nazmul 1
Turner c Nazmul b Nadif 4
Cusden c sub b Nazmul 1
Munday not out 1
Extras: (b-4, lb-2, w-11, nb-10) 27
Total: (All out in 103.1 overs) 396
Fall of wickets: 1-33, 2-54, 3-103, 4140, 5-142, 6-319, 7-326, 8-348, 9-357, 10-396.
Bowler O M R W
Nazmul 24 4 101 3
Shahadat 10.1 1 58 3
Nadif 36 7 109 4
Enamul 19 2 74 0
Ashim 14 3 48 0
BANGLADESH U-19S: Second innings (overnight 13-1) S Nafees c Davies b Turner 8
Nafees Iqbal c Davies b Wright 6
Aftab not out 21
Dhiman b Wright 10
Nazimuddin not out 4
Extras: (lb-2, w-1, nb-1) 4
Total: (For 3 wkts in 20 overs) 53
Fall of wickets: 1-8, 2-25, 3-38
Bowler O M R W
Turner 8 2 22 1
Wright 8 2 21 2
Bopara 3 2 8 0
Cusden 1 1 0 0