& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Lara still 7 runs short

REUTERS/AFP, Manchester
Andrew Flintoff took two quick wickets including that of Brian Lara for a duck as England reduced West Indies to 156 for four at tea on Day One of the third Test at Old Trafford on Thursday.
Shivnarine Chanderpaul was 30 not out with Dwayne Bravo on 22 at the break after Flintoff, who scored 167 as well as dismissing Lara in the second Test win at Edgbaston, bowled an excellent eight over spell for 15 runs having fully recovered from inflammation on an ankle spur.
Ramnaresh Sarwan first played a quicker Flintoff ball on to his stumps for 40 before Lara, still seven short of 10,000 Test runs, was yorked on leg stump.
The West Indies captain has shown a habit of shuffling across his stumps in this series and Flintoff exploited it perfectly on his home ground.
Debutant opener Sylvester Joseph, replacing Devon Smith, reached a deserved 45 with some sensible leaves before he played away from his body and edged Steve Harmison to Graham Thorpe at third slip.
Thorpe atoned for earlier dropping Joseph on 34 when he dug out a James Anderson yorker.
Harmison appeared rejuvenated after looking tired in the back-to-back first two Tests where he took only three wickets.
Anderson, again preferred to Simon Jones, was less convincing causing problems for wicketkeeper Geraint Jones with some wayward deliveries.
Matthew Hoggard earlier dismissed Chris Gayle for five in the fifth over of the day. The tall left hander was unnerved by some short Harmison deliveries before finding a leading edge off Hoggard to Andrew Strauss at point.
West Indies, 2-0 down in the four-match series, made three other changes with wicketkeeper Carlton Baugh, left arm spinner Dave Mohammed and fast bowler Fidel Edwards coming in for Ridley Jacobs, Omari Banks and Jermaine Lawson. Brian Lara won the toss and chose to
bat despite the green-tinged Old Trafford pitch. Play began an hour late because of overnight rain in Manchester.
SCOREBOARD
Scoreboard at tea on the first day of the third Test between England and West Indies at Old Trafford Thursday: WEST INDIES: First innings
Gayle c Strauss b Hoggard 5
Joseph c Thorpe b Harmison 45
Sarwan b Flintoff 40
Lara b Flintoff 0
Chanderpaul not out 30
Bravo not out 22
Extras: (b-8, lb-5, nb-1) 14
Total: (For 4 wkts in 47 overs) 156
Fall of wickets: 1-10, 2-85, 3-97, 4-108 To bat: Baugh, Mohammed, Collins, Collymore, Edwards
Bowler O M R W
Hoggard 11 2 37 1
Harmison 12 3 32 1
Flintoff 8 3 15 2
Anderson 10 1 42 0
Giles 6 0 17 0
ENGLAND: Trescothick, Strauss, Key, Vaughan, Thorpe, Flintoff, Jones, Giles, Hoggard, Harmison, Anderson Toss: West Indies
Umpires: Simon Taufel (Australia) and Aleem Dar (Pakistan)