& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

U-19s 202-8 at tea

SPORTS REPORTER
The Bangladesh Under-19 team limped to 202-8 at tea on the opening day of the second Test against the England Under-19s at Taunton in Somerset yesterday.
It was a stunning reversal of fortune for the tourists two days after the same side piled up a massive 535 against the ECB Development squad in a two-day practice match.
Richard McInnes' boys showed the same symptoms of collapsing early like their seniors when they slumped to 84-4 before a fifth-wicket stand of 68 runs between Nazimuddin and Nadif Chowdhury steadied the rocking boat.
The team went to lunch at 123 for four but they suffered another mini collapse in the second session.
Opener Nafees Iqbal, who plundered a double century a couple of days ago, was his erratic best. He scored a quickfire 27 off 29 balls but then push the self-destruct button.
His opening partner Shahriar Nafees (26) also wasted a good start.
Nadif Chowdhury top-scored with 36 and Nazimuddin made 35.
Wicketkeeper Mushfiqur Rahim salvaged the innings with a plucky unbeaten 30 off 74 balls. Paceman Shahdat Hossain was batting on nine with Rahim before the tea interval.
Bangladesh lost the first Test (four-day) by five wickets.
SCOREBOARD
Scoreboard at tea on the first day of the second Test between Bangla-desh U-19 and England U-19 at the County Ground in Taunton on Tuesday:
BANGLADESH U-19: First innings Shahriar c Patel b Harrison 26
Nafees c Denly b Harrison 27
Aftab c Davies b Bopara 12
Dhiman c Davies b Bopara 11
Nazimuddin lbw b Bopara 35
Nadif c Patel b Turner 36
Mushfiqur not out 30
Nazmul c Davies b Turner 0
Enamul c Davies b Turner 3
Shahadat not out 7
Extras: (lb-2, w-7, nb-6) 15
Total: (For 8 wkts in 72 overs) 202
To bat: Ashim.
Fall of wkts: 1-38, 2-63, 3-69, 4-84, 5152, 6-158, 7-160, 8-167.
Bowler O M R W
Turner 13 3 44 3
Cusden 7 1 31 0
Harrison 14 5 35 2
Bopara 18 5 37 3
Wright 14 3 29 0
Patel 4 0 15 0
Munday 1 0 4 0
Cook 1 0 5 0
ENGLAND U-19: Cook, Denly, Bopara, Hildreth, Wright, Patel, Davies, Harrison, Cusden, Munday,Turner.
Toss: Bangladesh Under-19.
Umpires: B Leadbeater and AGT
Whitehead