& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Sweet English revenge

Reuters, London
England's pace attack skittled New Zealand for 161 runs on a difficult Headlingley surface before cruising to a nine-wicket triumph in the second Test to seal the series.
Matthew Hoggard, with four wickets, and Steve Harmison, with three, ended the tourists' resistance after an entertaining opening to Monday's final day before England knocked off their target of 45 on an increasingly erratic pitch.
Marcus Trescothick (30 not out) pulled the winning boundary as England won in the run-up to lunch, securing an unassailable 2-0 lead in the three-match series.
The series win was sweet revenge for 1999, when the New Zealanders beat England 2-1 on home soil. England, however, have since climbed from bottom of the world rankings to third.
They head for Trent Bridge on Thursday with a chance of completing the first whitewash between the sides since England's 3-0 home success in 1978 under Michael Brearley.
English wicketkeeper Geraint Jones was named man-of-the-match for his maiden Test century in the first innings followed by an impressive display behind the stumps.
The tourists, hampered by a string of injuries before and during the match, had resumed on 102 for five, still 15 behind, and, with the pitch misbehaving, opted for all-out attack as their only chance of defence.
Within 45 minutes, however, the innings was over.
Jacob Oram (36 not out off 32 balls) did his best to set a target with some explosive hitting, including two slogged sixes, as the
runs flowed.
But the wickets kept tumbling as well. Hoggard made the early breakthrough when Scott Styris edged behind, Jones taking a spectacular one-handed catch diving across first slip.
The Yorkshire swing bowler then trapped danger man Chris Cairns lbwfor 10.
Harmison joined in after a poor opening spell when Michael Papps, coming in at nine because of a broken finger, played a rising
delivery into the hands of captain Michael Vaughan at silly mid-off.
Spinner Daniel Vettori was unable to bat after tearing his hamstring on Sunday. Chris Martin was the last man out, run out by Jones after Oram tried to steal a bye to keep the strike.
Hoggard took four for 75 with Harmison, who took seven wickets in the match, backing him up with three for57.
Despite a difficult wicket of varying bounce, New Zealand scored 409 in their first innings, followed by the home side's 526.
England have now won five of their fastsixTests.
SCOREBOARD
Final scoreboard on the fifth and final day of the second Test between England and New Zealand at Headingley on Monday:
NEW ZEALAND: First innings 409 (Fleming 97, Papps 86, McCullum 54; Harmison 4-74)
ENGLAND: First innings 526 (Trescothick 132, Jones 100, Flintolf 94, Strauss 62; Styris 3-88)
NEW ZEALAND: Second innings (overnight 102-5)
Richardson cjonesb Hoggard 40
Fleming c Strauss b Flintoff 11
McCullum cT'thickbHarmison20
Astle lbw b Hoggard 8
Styris cjonesb Hoggard 19
Tuffey cjonesb Harmison 7
Oram not out 36
Cairns lbwb Hoggard 10
Papps c Vaughan b Harmison 0
Martin run out 0
Vettori absent hurt 0
Extras: (b-4, lb-4, nb-2) 10
Total: (For 9 wkts in 42 overs) 161 Fall of wickets: 1-39, 2-75, 3-77, 4-84,5-91,6-118, 7-144,8-149,9-161 Bowler O M R W
Hoggard 15 4 75 4
Harmison 16 5 57 3
Flintoff 6 0 16 1
Saggers 5 3 5 0
ENGLAND: Second innings Trescothick not out 30
Strauss cAstle b Tuffey 10
Butcher not out 5
Extras: 0
Total: (For lwkt in 8 overs) 45
Fallofwickets: 1-18
Did not bat: Vaughan, Thorpe, Flintoff, Jones, Giles, Hoggard, Saggers, Harmison
Bowler O M R W
Martin 4 1 17 0
Tuffey 4 0 28 0
Result: England won by 9 wickets and take winning 2-0 lead.
Man-of-the-match: Geraint Jones. Toss: England.