& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

INDIA-PAKISTAN SCOREBOARD
Scoreboard of the Pakistan innings against India in the second one-day international at the Pindi CricketStadium onHiesday: PAKISTAN
Hameed run out 86
Afridi bYuvraj 80
Youhanab Yuvraj 24
InzamambNehra 29
Younis c Dravid bNehra 28
MoinlbwbNehra 0
Malik not out 30
Razzaqnotout 31
Extras: (lb-6,nb-l,w-14) 21
Total:(For6wktsin50overs) 329
Fall of wickets: 1-138,2-191,3-225, 4-249,5-249,6-284
Did not bat: Akhtar, Sami, Shabbir
FROM PAGE 13
Bowler 0 M R W
Balaji 6 0 47 0
Zaheer 7 0 72 0
Nehra 10 0 44 3
Sehwag S 0 39 0
Yuvraj 10 I 41 2
Powar 6 0 35 0
Tendulkar 6 0 45 0
INDIA: Ganguly, Sehwag, Tendulkar, Dravid, Laxman, Yuvraj, Kaif, Powar, Zaheer, Balaji, Nehra.
Umpires: Simon Taufel (Australia) and Asad Rauf (Pakistan).