& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Star-crossed Canizares

REUTERS, Madrid
The freak accident that ruled Spain goalkeeper Santiago Canizares out of the World Cup has forced coach Jose Antonio Camacho to make a rapid readjustment to his plans for the finals.
The Valencia player, who was set to be Spain's first choice keeper, severed a tendon in his right foot in a bizarre accident involving a bottle of cologne in his hotel room at the team's training base in Jerez on Friday.
A shard of glass dropped on to the player's foot and cut into the tendon in his big toe after he had accidentally smashed the bottle against the sink in the bathroom.
The 32-year-old, who has won 35 caps for Spain, was rushed to hospital where he underwent surgery to repair the tendon.
Doctors said he would be immobilised for about a month before beginning his rehabilitation.
Spanish team doctor, Genero Borras, said that the player was devastated by the injury.
"Canizares is in shock," he was quoted as saying in sports daily Marca on Saturday.
"It is very difficult for him to take in an accident like this. This was going to be his World Cup and now he will miss it because of a simple domestic accident."
Spain coach Camacho responded to the news by calling up the uncapped Malaga keeper Pedro Contreras, but Real Madrid's Iker Casillas is now likely to be his number one choice ahead of Valladolid's Ricardo.
The decision confirms that Spain's former number one keeper Jose Molina of Deportivo Coruna is completely out of favour.
Molina has not played for the national side since making a gaffe in Spain's opening match of Euro 2000 against Norway and, despite his outstanding form for his club this season, Camacho has decided to overlook him once again.
For Casillas the last week has seen a remarkable turnaround in his fortunes.
The 20-year-old, who was
dropped by Real coach Vicente del Bosque in the second half of the season, began Wednesday's Champions League final on the bench.
But an injury to Cesar saw him come on in the 68th minute to become the hero of the second half as he produced a string of superb reflex saves to help Real to hang on to their 2-1 lead against Bayer Leverkusen.
Cesar's injury meant that he was ruled out as a replacement for Canizares and Casillas has now been elevated from the Real bench to the status of Spain's number one keeper.
"It was a terrible piece of bad luck for Canizares...and I am certainly not happy because a team mate has been injured," Casillas told sports daily As.
"But football is like that ... Now Ricardo, Contreras and myself will have to fight it out for the place and any of us could be chosen.
"It is my first World Cup and I just want to enjoy it whatever happens."
The Spain squad leaves on Monday for South Korea and Japan, where they are pitted against Slovenia, Paraguay and South Africa in the opening round.